arXiv:0904.1976v1 [hep-ex] 13 Apr 2009

CPT and QM tests using kaon interferometry

A. Di Domenico Dipartimento di Fisica, Università di Roma “La Sapienza”, and I.N.F.N. Sezione di Roma, P.le A. Moro, 2, I-00185 Rome, Italy e-mail: antonio.didomenico@roma1.infn.it

The neutral kaon system offers a unique possibility to perform fundamental tests of CP T invariance, as well as of the basic principles of quantum mechanics. The most recent and significant limits on CP T violation are reviewed, including the ones related to possible decoherence mechanisms or Lorentz symmetry breaking, which might be induced by quantum gravity. The experimental results show no deviations from the expectations of quantum mechanics and CP T symmetry, while the accuracy in some cases reaches the interesting Planck scale region. Finally, prospects for this kind of experimental studies at the upgraded DAΦNE e^+e^− collider at Frascati are briefly discussed.

1. Introduction

The three discrete symmetries of quantum mechanics, C (charge conjugation), P (parity), and T (time reversal) are known to be violated in nature, both singly and in pairs. Only the combination of the three — CP T (in any order) — appears to be an exact symmetry of nature.

A rigorous proof of the CP T theorem can be found in Refs [1, 2, 3, 4] (see also Refs [5, 6, 7] for some recent developments); it ensures that exact CP T invariance holds for any quantum field theory assuming (1) Lorentz invariance, (2) Locality, and (3) Unitarity (i.e. conservation of probability). Testing the validity of CP T invariance therefore probes the most fundamental assumptions of our present understanding of particles and their interactions.

The neutral kaon doublet is one of the most intriguing systems in nature. During its time evolution a neutral kaon oscillates between its particle and antiparticle states with a beat frequency Δm ≈ 5.3 × 10^9 s^{−1}, where Δm is the small mass difference between the exponentially decaying states K_L and K_S. The fortunate coincidence that Δm is about half the decay width of K_S makes it possible to observe a variety of intricate interference phenomena in the production and decay of neutral kaons. In turn, such observations enable us to test quantum mechanics, the interplay of different conservation laws and the validity of various symmetry principles. In particular the extreme sensitivity of the neutral kaon system to a variety of CP T - violating effects makes it one of the best candidates for an accurate experimental test of this symmetry [8]. As a figure of merit, the fractional mass difference (m_K0 − m¯_K0 ) /m_K0 can be considered: it can be measured at the level of O(10^{−18}) for neutral kaons, while, for comparison, a limit of O(10^{−14}) can be reached on the corresponding quantity for the B^0 − B̄^0 system, and only of O(10^{−8}) for proton-antiproton [9].

2. CPT test from unitarity

The real part of the complex parameter δ, describing CP T violation in K^0 − K̄^0 mixing, has been measured by the CPLEAR collaboration studying the time behaviour of semileptonic decays from initially tagged K^0 and K̄^0 mesons [10]:

ℜδ = (0.30 ± 0.33stat ± 0.06syst) × 10^{−3} . (1)

One of the most precise and significant tests of the CP T symmetry comes from the unitarity relation, originally derived by Bell and Steinberger [11]: ( Γ_S + Γ_L Γ_S − Γ_L

+ i tan ϕ_{SW} ) [ ℜϵ 1 + |ϵ|^2 − iℑδ ]

= 1 Γ_S − Γ_L ∑ f A^∗(K_S → f)A(K_L → f) ≡ ∑ f α_f , (2)

where ϵ is the usual complex parameter describing CP violation in K^0 −K̄^0 mixing; Γ_S and Γ_L are the widths of the physical states K_S and K_L; ϕ_{SW} is the superweak phase; A(K_i → f) is the decay amplitude of the state K_i into final state f, and the sum runs over all possible final states. The above relationship can be used to bound the parameter ℑδ, after having provided all the α_i parameters, Γ_S, Γ_L, and ϕ_{SW} as inputs. Using several measurements from the KLOE experiment [12], values from the Particle Data Group (PDG), and a combined fit of KLOE and CPLEAR data, the following result is obtained [9]:

ℑδ = (−0.6 ± 1.9) × 10^{−5} , (3)

which is the most stringent limit on ℑδ^1, the main limiting factor of this result being the uncertainty on the phase ϕ_{+−} entering in the parameter α_π+_π− .

1The result ℜϵ = (161.2 ± 0.6) × 10^{−5}, which is obtained in the same analysis, is not relevant for the discussion here.

The limits on ℑδ and ℜδ can be used to constrain the mass and width difference between K^0 and K̄^0. In the limit Γ_K0 −Γ¯_K0 = 0, i.e. neglecting CP T -violating effects in the decay amplitudes, the best bound on the neutral kaon mass difference is obtained:

|m_K0 − m¯_K0 | < 5.1 × 10^{−19} GeV at 95 % CL .

A preliminary update including the latest results on ϕ_{+−} by the KTeV collaboration [13] yields slightly improved results [14]:

ℑδ = (−0.1 ± 1.4) × 10^{−5} |m_K0 − m¯_K0 | < 4.0 × 10^{−19} GeV at 95 % CL .

3. CPT and QM tests

DAΦNE, the Frascati ϕ-factory, is an e^+e^− collider working at a center of mass energy of √ s ∼ 1020 MeV, corresponding to the peak of the ϕ resonance. The ϕ production cross section is ∼ 3μb, and its decay into K^0K̄^0 has a branching fraction of 34%. The neutral kaon pair is produced in a coherent quantum state with quantum numbers J^{P C} = 1^{−−}: |i⟩ = 1 √ 2 {|K^0⟩|K̄^0⟩ − |K̄^0⟩|K^0⟩} = N √ 2 {|K_S⟩|K_L⟩ − |K_L⟩|K_S ⟩} (4) where N = √ (1 + |ϵ_S |^2)(1 + |ϵ_L|^2)/(1 − ϵ_Sϵ_L) ≃ 1 is a normalization factor, and ϵ_{S,L} = ϵ ± δ.

The detection of a kaon at large (small) times tags a K_S (K_L) in the opposite direction.

The KLOE detector consists mainly of a large volume drift chamber[15] surrounded by an electromagnetic calorimeter[16]. A superconducting coil provides a 0.52 T solenoidal magnetic field.

At KLOE a K_S is tagged by identifying the interaction of the K_L in the calorimeter (K_L-crash), while a K_L is tagged by detecting a K_S → π^+π^− decay near the interaction point (IP).

KLOE completed the data taking in March 2006 with a total integrated luminosity L ∼ 2.5 fb^{−1}, corresponding to ∼ 7.5 × 10^9 ϕ-mesons produced.

The quantum interference between the two kaons initially in the entangled state in eq.(4) and decaying in the CP violating channel ϕ → K_SK_L → π^+π^−π^+π^−, has been observed for the first time by the KLOE collaboration [17]. The measured Δt distribution, with Δt the absolute value of the time difference of the two π^+π^− decays, can be fitted with the distribution:

I(π^+π^−, π^+π^−; Δt) ∝ e^{−ΓLΔt} + e^{−ΓS Δt}

−2(1 − ζ_{SL})e^{− (ΓS +ΓL)2 Δt} cos(ΔmΔt) , (5) where the quantum mechanical expression in the {K_S, K_L} basis has been modified with the introduction of a decoherence parameter ζ_{SL}, and a factor (1 − ζ_{SL}) multiplying the interference term. Analogously, a ζ_0¯_0 parameter can be defined in the {K^0, K̄^0} basis [18]. After having included resolution and detection efficiency effects, having taken into account the background due to coherent and incoherent K_Sregeneration on the beam pipe wall, the small contamination of non-resonant e^+e^− → π^+π^−π^+π^− events, and keeping Δm, Γ_S and Γ_L fixed to the PDG values, the fit is performed on the Δt distribution. The analysis of a data sample corresponding to L ∼ 380 pb^{−1} yields the following results [17]:

ζ_{SL} = 0.018 ± 0.040stat ± 0.007syst

ζ_0¯_0 = (1.0 ± 2.1stat ± 0.4syst) × 10^{−6} , (6)

compatible with the prediction of quantum mechanics, i.e. ζ_{SL} = ζ_0¯_0 = 0, and no decoherence effect. In particular the result on ζ_0¯_0 has a high precision, O(10^{−6}), due to the CP suppression present in the specific decay channel; it is an improvement by five orders of magnitude over the previous limit, obtained by Bertlmann and co-workers [18] in a re-analysis of CPLEAR data [19]. This result can also be compared to a similar one recently obtained in the B meson system [20], where an accuracy of O(10^{−2}) has been reached.

At a microscopic level, in a quantum gravity picture, space-time might be subjected to inherent nontrivial quantum metric and topology fluctuations at the Planck scale (∼ 10^{−33} cm), called generically space-time foam, with associated microscopic event horizons. This space-time structure would lead to pure states evolving to mixed states, i.e. the decoherence of apparently isolated matter systems [21]. This decoherence, in turn, necessarily implies, by means of a theorem [22], CP T violation, in the sense that the quantum mechanical operator generating CP T transformations cannot be consistently defined.

A model for decoherence can be formulated [23] in which a single kaon is described by a density matrix ρ that obeys a modified Liouville-von Neumann equation: dρ dt = −iHρ + iρH^† + L(ρ; α, β, γ) (7) where H is the neutral kaon effective Hamiltonian, and the extra term L(ρ; α, β, γ) would induce decoherence in the system, and depends on three real parameters, α, β and γ, which violate CP T symmetry and quantum mechanics (they satisfy the inequalities α, γ > 0 and αγ > β^2 - see Refs. [23, 24]). They have units of mass and are presumed to be at most O(m^2_K /M_{P lanck}) ∼ 2 × 10^{−20} GeV, where M_{P lanck} = 1 √ G_N = 1.22 × 10^{19} GeV is the Planck mass.

The CPLEAR collaboration, studying the time behaviour of single neutral kaon decays to π^+π^− and πeν final states, obtained the following results [25]:

α = (−0.5 ± 2.8) × 10^{−17} GeV β = (2.5 ± 2.3) × 10^{−19} GeV γ = (1.1 ± 2.5) × 10^{−21} GeV . (8)

The KLOE collaboration, studying the same I(π^+π^−, π^+π^−; Δt) distribution as in the ζ parameters analysis, in the simplifying hypothesis of complete positivity^2 [26], i.e. α = γ and β = 0, obtained the following result [17]: γ = ( 1.3^{+2.8}_{−2.4}stat ± 0.4syst ) × 10^{−21} GeV , (9)

All results are compatible with no CP T violation, while the sensitivity approaches the interesting level of O(10^{−20} GeV).

As discussed above, in a quantum gravity framework inducing decoherence, the CP T operator is illdefined. This consideration might have intriguing consequences in correlated neutral kaon states, where the resulting loss of particle-antiparticle identity could induce a breakdown of the correlation in state (4) imposed by Bose statistics [27, 28]. As a result the initial state (4) can be parametrized in general as: |i⟩ = 1 √ 2 [|K^0⟩|K̄^0⟩ − |K̄^0⟩|K^0⟩ +ω ( |K^0⟩|K̄^0⟩ + |K̄^0⟩|K^0⟩ ) ] , (10)

where ω is a complex parameter describing a completely novel CP T violation phenomenon, not included in previous analyses. Its order of magnitude could be at most |ω| ∼ [ (m^2_K /M_{Planck})/ΔΓ ]_{1/2} ∼ 10^{−3}

with ΔΓ = Γ_S − Γ_L. A similar analysis performed by the KLOE collaboration on the same I(π^+π^−, π^+π^−; Δt) distribution as before, including in the fit the modified initial state eq.(10), yields the first measurement of the complex parameter ω [17]: ℜ(ω) = ( 1.1^{+8.7}_{−5.3}stat ± 0.9syst ) × 10^{−4} ℑ(ω) = ( 3.4^{+4.8}_{−5.0}stat ± 0.6syst ) × 10^{−4} , (11)

with an accuracy that already reaches the interesting Planck scale region.

2This hypothesis, reducing the number of free parameters, makes the fit of the experimental distribution easier, even though it is not strictly necessary.

A preliminary analysis of a KLOE data sample corresponding to L ∼ 1 fb^{−1} yields the following updated results [33]:

ζ_{SL} = 0.009 ± 0.022stat ζ_0¯_0 = (0.03 ± 1.2stat) × 10^{−6} γ = ( 0.8^{+1.5}_{−1.3}stat ) × 10^{−21} GeV ℜ(ω) = ( −2.5^{+3.1}_{−2.3}stat ) × 10^{−4} ℑ(ω) = ( −2.2^{+3.4}_{−3.1}stat ) × 10^{−4} ,

while the analysis of the full KLOE data sample is being completed.

4. CPT violation and Lorentz symmetry breaking

CP T invariance holds for any realistic Lorentzinvariant quantum field theory. However a very general theoretical possibility for CP T violation is based on spontaneous breaking of Lorentz symmetry [29, 30, 31], which appears to be compatible with the basic tenets of quantum field theory and retains the property of gauge invariance and renormalizability (Standard Model Extensions - SME). In SME for neutral kaons, CP T violation manifests to lowest order only in the parameter δ, and exhibits a dependence on the 4-momentum of the kaon: δ ≈ i sin ϕ_{SW} e^{iϕSW} γ_K (Δa_0 − ⃗β_K · Δ⃗a)/Δm (12) where γ_K and ⃗β_K are the kaon boost factor and velocity in the observer frame, and Δa_μ are four CP T - and Lorentz-violating coefficients for the two valence quarks in the kaon.

Following Ref. [30], the time dependence arising from the rotation of the Earth can be explicitly displayed in eq. (12) by choosing a three-dimensional basis (X̂, Ŷ , Ẑ) in a non-rotating frame, with the Ẑ axis along the Earth’s rotation axis, and a basis (x̂, ŷ, ẑ) for the rotating (laboratory) frame. The CP T violating parameter δ may then be expressed as: δ = 1 2π ∫_{2π} 0 δ(⃗p, t_{sid})dϕ = i sin ϕ_{SW} e^{iϕSW} Δm γ_K {Δa_0

+β_K Δa_Z cos θ cos χ +β_K (Δa_Y sin χ cos θ sin Ωt_{sid} +Δa_X sin χ cos θ cos Ωt_{sid})} , (13)

where t_{sid} is the sidereal time, Ω is the Earth’s sidereal frequency, cos χ = ẑ · Ẑ, θ and ϕ are the conventional polar and azimuthal angles defined in the laboratory frame about the ẑ axis, and an integration on the azimuthal angle ϕ has been performed, assuming a symmetric decay distribution in this variable^3. The sensitivity to the four Δa_μ parameters can be very different for fixed target and collider experiments, showing complementary features [30].

At KLOE the Δa_0 parameter can be evaluated through the difference of the semileptonic charge asymmetries: A_{S,L} = Γ(K_{S,L} → π^−l^+ν) − Γ(K_{S,L} → π^+l^−ν̄) Γ(K_{S,L} → π^−l^+ν) + Γ(K_{S,L} → π^+l^−ν̄) , by performing the measurement of each asymmetry with a symmetric integration over the polar angle θ, thus averaging to zero any possible contribution from the terms proportional to cos θ in eq.(13): A_S − A_L ≃ [ 4ℜ ( i sin ϕ_{SW} e^{iϕSW} ) γ_K Δm ] Δa_0 . (14)

In this way a first preliminary evaluation of the Δa_0 parameter can be obtained by KLOE [8, 32]:

Δa_0 = (0.4 ± 1.8) × 10^{−17} GeV . (15)

With the analysis of the full KLOE data sample (L = 2.5 fb^{−1}) an accuracy σ(Δa_0) ∼ 7 × 10^{−18} GeV could be reached.

At KLOE the Δa_{X,Y,Z} parameters can be evaluated performing a sidereal time dependent analysis of the asymmetry:

A(Δt) =

N^+ − N^− N^+ + N^− , with

N^+ = I ( π^+π^−(+), π^+π^−(−); Δt > 0 ) N^− = I ( π^+π^−(+), π^+π^−(−); Δt < 0 ) , where the two identical final states are distinguished by their emission in the forward (cos θ > 0) or backward (cos θ < 0) hemispheres (denoted by the symbols + and −, respectively), and Δt is the time difference between (+) and (−) π^+π^− decays. A preliminary analysis based on a data sample corresponding to an integrated luminosity L ∼ 1 fb^{−1} yields the following results [8, 32, 33]:

Δa_X = (−6.3 ± 6.0) × 10^{−18} GeV Δa_Y = (2.8 ± 5.9) × 10^{−18} GeV Δa_Z = (2.4 ± 9.7) × 10^{−18} GeV . (16)

A preliminary measurement performed by the KTeV collaboration [34] based on the search for sidereal time variation of the phase ϕ_{+−} constrains Δa_X

3Although not necessary, this assumption is taken here in order to simplify formulas.

and Δa_Y to less than 9.2 × 10^{−22} GeV at 90% C.L. These results can also be compared to similar ones recently obtained in the B meson system [35], where an accuracy on the Δa^B_μ parameters of O(10^{−13}GeV) has been reached.

5. Future plans

A proposal [36, 37] has been presented for a physics program to be carried out with an upgraded KLOE detector, KLOE-2, at an upgraded DAΦNE machine, which is expected to deliver an integrated luminosity up to 20 ÷ 50 fb^{−1}. The major upgrade of the KLOE detector would consist in the addition of an inner tracker for the improvement of decay vertex resolution, therefore improving the sensitivity on several parameters based on kaon interferometry measurements. The KLOE-2 program concerning neutral kaon interferometry is summarized in table I, where the KLOE- 2 statistical sensitivities on the main parameters that can be extracted from kaon decay time distributions I(f_1, f_2; Δt) (with different choices of final states f_1 and f_2) are listed for an assumed integrated luminosity L = 50 fb^{−1}, and compared to the best presently published measurements.

6. Conclusions

The neutral kaon system constitutes an excellent laboratory for the study of the CP T symmetry and the basic principles of quantum mechanics. Several parameters related to possible CP T violations, including decoherence and Lorentz symmetry breaking effects, have been measured, in some cases with a precision reaching the interesting Planck scale region. Simple quantum coherence tests have been also performed. All results are consistent with no violation of the CP T symmetry and/or quantum mechanics.

A ϕ-factory represents a unique opportunity to push forward these studies. It is also an ideal place to investigate the entanglement and correlation properties of the produced K^0K̄^0 pairs. A proposal for continuing the KLOE physics program (KLOE-2) at an improved DAΦNE machine, able to deliver an integrated luminosity up to 20÷50 fb^{−1}, has been recently presented. Improvements by about one order of magnitude in almost all present limits are expected.

Acknowledgments

I would like to thank the organizing committee, and in particular Elisabetta Barberio and Antonio Limosani for the organization of this very interesting and successful conference, and the pleasant stay in Melbourne.

Table I KLOE-2 statistical sensitivities on several parameters.

f1 f2 Parameter Best published meas. KLOE-2 (50 fb^{−1}) KS → πeν AS (1.5 ± 11) × 10^{−3} ± 1 × 10^{−3} π^+π^− πlν AL (3322 ± 58 ± 47) × 10^{−6} ± 25 × 10^{−6} π^+π^− π^0π^0 ℜ^{ϵ′}_ϵ (1.65 ± 0.26) × 10^{−3} (PDG fit) ± 0.2 × 10^{−3} π^+π^− π^0π^0 ℑ^{ϵ′}_ϵ (−1.2 ± 2.3) × 10^{−3} (PDG fit) ± 3 × 10^{−3} π^+l^−ν̄ π^−l^+ν (ℜδ + ℜx−) ℜδ = (0.25 ± 0.23) × 10^{−3} (PDG) ± 0.2 × 10^{−3} ℜx− = (−4.2 ± 1.7) × 10^{−3} (PDG) π^+l^−ν̄ π^−l^+ν (ℑδ + ℑx+) ℑδ = (−0.6 ± 1.9) × 10^{−5} (PDG) ± 3 × 10^{−3} ℑx+ = (0.2 ± 2.2) × 10^{−3} (PDG) π^+π^− π^+π^− Δm 5.288 ± 0.043 × 10^9 s^{−1} ± 0.03 × 10^9 s^{−1} π^+π^− π^+π^− ζSL (1.8 ± 4.1) × 10^{−2} ± 0.2 × 10^{−2} π^+π^− π^+π^− ζ_0¯_0 (1.0 ± 2.1) × 10^{−6} ± 0.1 × 10^{−6} π^+π^− π^+π^− α (−0.5 ± 2.8) × 10^{−17} GeV ±2 × 10^{−17} GeV π^+π^− π^+π^− β (+2.5 ± 2.3) × 10^{−19} GeV ± 0.1 × 10^{−19} GeV π^+π^− π^+π^− γ (+1.1 ± 2.5) × 10^{−21} GeV ± 0.2 × 10^{−21} GeV (compl. pos. hyp.) ± 0.1 × 10^{−21} GeV π^+π^− π^+π^− ℜω (1.1^{+8.7}_{−5.3} ± 0.9) × 10^{−4} ± 2 × 10^{−5} π^+π^− π^+π^− ℑω (3.4^{+4.8}_{−5.0} ± 0.6) × 10^{−4} ± 2 × 10^{−5} KS,L → πeν Δa0 (prelim.: (0.4 ± 1.8) × 10^{−17} GeV) ± 2 × 10^{−18} GeV π^+π^− π^+π^− ΔaZ (prelim.: (2.4 ± 9.7) × 10^{−18} GeV) ± 7 × 10^{−19} GeV π^+π^− π^+π^− ΔaX , ΔaY (prelim.: < 9.2 × 10^{−22} GeV) ± 4 × 10^{−19} GeV

References

[1] G. Lueders, Ann. Phys. (NY) 2 (1957) 1, reprinted in Ann. Phys. (NY) 281 (2000) 1004.

[2] W. Pauli, Exclusion principle, Lorentz group and reflexion of space-time and charge in Niels Bohr and the development of physics, edited by W. Pauli, Pergamon, London, 1955, p.30.

[3] J. S. Bell, Proc. R. Soc. London A 231 (1955) 479 [4] R. Jost, Helv. Phys. Acta 30 (1957) 409. [5] O. W. Greenberg, Phys. Rev. Lett. 89 (2002) 231602.

[6] O. W. Greenberg, Found. Phys. 36 (2006) 1535 (arXiv: hep-ph/0309309).

[7] S. Hollands, Commun. Math. Phys. 244 (2004) 209.

[8] Handbook on neutral kaon interferometry at a ϕfactory, A. Di Domenico ed., Frascati Physics Series 43, INFN-LNF, Frascati, 2007.

[9] C. Amsler et al., Particle Data Group, Phys. Lett.

B667 (2008) 1.

[10] A. Angelopoulos et al., CPLEAR collaboration, Eur. Phys. J. C 22 (2001) 55.

[11] J.S. Bell and J. Steinberger, Proc. Oxford Int.

Conf. on Elementary Particles (1965).

[12] F. Ambrosino et al., KLOE collaboration, JHEP 12 011 (2006).

[13] E. Worcester, these proceedings.

[14] M. Palutan, talk given at the Flavianet Kaon Workshop, 12-14 June 2008, Capri, Italy.

[15] M. Adinolfi et al., KLOE collaboration, Nucl. Instr. and Meth. A 488 (2002) 51.

[16] M. Adinolfi et al., KLOE collaboration, Nucl. Instr. and Meth. A 482 (2002) 364.

[17] F. Ambrosino et al., KLOE collaboration, Phys.

Lett. B 642 (2006) 315.

[18] R. A. Bertlmann, W. Grimus, B. C. Hiesmayr, Phys. Rev. D 60 (1999) 114032.

[19] A. Apostolakis et al., CPLEAR collaboration, Phys. Lett. B 422 (1998) 339.

[20] A. Go et al, Belle collaboration, Phys. Rev. Lett.

99 (2007) 131802.

[21] S. Hawking, Commun. Math. Phys. 87 (1982) 395.

[22] R. Wald, Phys. Rev. D 21 (1980) 2742. [23] J. Ellis, J. S. Hagelin, D. V. Nanopoulos, M. Srednicki , Nucl. Phys. B 241 (1984) 381.

[24] J. Ellis, J. L. Lopez, N. .E. Mavromatos, D. V. Nanopoulos, Phys. Rev. D 53 (1996) 3846.

[25] R. Adler et al., CPLEAR collaboration, Phys.

Lett. B 364 (1995) 239.

[26] F. Benatti, R. Floreanini, Nucl. Phys. B 488 (1997) 335; Nucl. Phys. B 511 (1998) 550; Phys. Lett. B 468 (1999) 287.

[27] J. Bernabeu, N. Mavromatos, J. Papavassiliou,

Phys. Rev. Lett. 92 (2004) 131601.

[28] J. Bernabeu, N. Mavromatos, J. Papavassiliou, A. Waldron-Lauda, Nucl. Phys. B 744 (2006) 180.

[29] V. A. Kostelecký, Phys. Rev. Lett. 80, 1818 (1998).

[30] V. A. Kostelecký, Phys. Rev. D 61, 016002 (1999).

[31] V. A. Kostelecký, Phys. Rev. D 64, 076001 (2001).

[32] A. Di Domenico, KLOE collaboration, CPT and Lorentz Symmetry IV, V.A. Kostelecký, ed., World Scientific, Singapore, 2008 [33] M. Testa et al., KLOE collaboration, Proceedings of the XLIII Rencontres de Moriond, Electroweak Interactions and Unified Theories, 1-8 March 2008, La Thuille, Italy, arXiv: hep-ex/0805.1969

(please note that in this reference the quoted results on Δa_Y and Δa_Z have a wrong sign).

[34] H. Nguyen, KTeV collaboration, in CPT and Lorentz Symmetry II, V.A. Kostelecký, ed., World Scientific, Singapore, 2002.

[35] B. Aubert, et al., BABAR collaboration, Phys.

Rev. Lett. 100 (2008) 131802.

[36] R. Beck et al, KLOE-2 collaboration, Expression of interest for the continuation of the KLOE physics program at DAΦNE upgraded in luminosity and in energy, March 31, 2006, available at http://www.lnf.infn.it/lnfadmin/direzione/ roadmap/LoIKLOE.pdf.

[37] R. Beck et al, KLOE-2 collaboration, A proposal for the roll-in of the KLOE-2 detector, LNF- 07/19(IR), INFN-LNF, Frascati, 2007.