arXiv:0905.4846v1 [hep-ex] 29 May 2009

The K^−π^+ S-wave from the D^+ → K^−π^+π^+ decay

J. M. Link and P. M. Yager University of California, Davis, CA 95616

J. C. Anjos, I. Bediaga, C. Castromonte, A. A. Machado, J. Magnin, A. Massafferri, J. M. de Miranda, I. M. Pepe, E. Polycarpo, and A. C. dos Reis Centro Brasileiro de Pesquisas Físicas, Rio de Janeiro, RJ, Brazil

S. Carrillo, E. Cuautle, A. Sánchez-Hernández, C. Uribe, and F. Vázquez CINVESTAV, 07000 México City, DF, Mexico

L. Agostino, L. Cinquini, J. P. Cumalat, V. Frisullo, B. O’Reilly, I. Segoni, and K. Stenson University of Colorado, Boulder, CO 80309

J. N. Butler, H. W. K. Cheung, G. Chiodini, I. Gaines, P. H. Garbincius, L. A. Garren, E. Gottschalk, P. H. Kasper, A. E. Kreymer, R. Kutschke, and M. Wang Fermi National Accelerator Laboratory, Batavia, IL 60510

L. Benussi, S. Bianco, F. L. Fabbri, and A. Zallo Laboratori Nazionali di Frascati dell’INFN, Frascati, Italy I-00044

E. Casimiro and M. Reyes Physics Department, DCI Campus Leon, University of Guanajuato, 37150 Leon, Guanajuato, Mexico

C. Cawlfield, D. Y. Kim, A. Rahimi, and J. Wiss University of Illinois, Urbana-Champaign, IL 61801

R. Gardner and A. Kryemadhi Indiana University, Bloomington, IN 47405

Y. S. Chung, J. S. Kang, B. R. Ko, J. W. Kwak, and K. B. Lee Korea University, Seoul, Korea 136-701

K. Cho and H. Park Kyungpook National University, Taegu, Korea 702-701

G. Alimonti, S. Barberis, M. Boschini, A. Cerutti, P. D’Angelo, M. DiCorato, P. Dini, L. Edera, S. Erba, P. Inzani, F. Leveraro, S. Malvezzi, D. Menasce, M. Mezzadri, L. Moroni, D. Pedrini, C. Pontoglio, F. Prelz, M. Rovere, and S. Sala INFN and University of Milano, Milano, Italy

T. F. Davenport III University of North Carolina, Asheville, NC 28804

V. Arena, G. Boca, G. Bonomi, G. Gianini, G. Liguori, D. Lopes Pegna, M. M. Merlo, D. Pantea, S. P. Ratti, C. Riccardi, and P. Vitulo Dipartimento di Fisica Nucleare e Teorica and INFN, Pavia, Italy

C. Göbel and J. Otalora Pontifícia Universidade Católica, Rio de Janeiro, RJ, Brazil

H. Hernandez, A. M. Lopez, H. Mendez, A. Paris, J. Quinones, J. E. Ramirez, and Y. Zhang University of Puerto Rico, Mayaguez, PR 00681

J. R. Wilson University of South Carolina, Columbia, SC 29208

T. Handler and R. Mitchell University of Tennessee, Knoxville, TN 37996

D. Engh, M. Hosack, W. E. Johns, E. Luiggi, M. Nehring, P. D. Sheldon, E. W. Vaandering, and M. Webster Vanderbilt University, Nashville, TN 37235

M. Sheaff University of Wisconsin, Madison, WI 53706 (Dated: June 1, 2009)

Using data from FOCUS (E831) experiment at Fermilab, we present a model independent partialwave analysis of the K^−π^+ S-wave amplitude from the decay D^+ → K^−π^+π^+. The S-wave is a generic complex function to be determined directly from the data fit. The P- and D-waves are parameterized by a sum of Breit-Wigner amplitudes. The measurement of the S-wave amplitude covers the whole elastic range of the K^−π^+ system.

PACS numbers: 13.25Ft,13.30Eg,13.87Fh

I. INTRODUCTION

Over forty years have passed since the birth of the Constituent Quark Model, yet the scalar mesons still challenge theoreticians and experimentalists. Many states have been reported. Some still need confirmation, others need to have better measurements of the pole position and couplings to specific channels. The identification of the nature of each state — regular qq mesons, tetraquarks, molecules, glueballs — is a major task which will only be accomplished combining results from different types of data.

An important problem is the understanding of the low energy part of the S-wave K^−π^+ spectrum, where the existence of an I = 1/2 state, the κ(800) meson, has been the subject of a long-standing debate. Evidence for a neutral low mass scalar state in heavy flavor decays has been reported by several experiments [1, 2, 3, 4]. The pole position has been determined recently using Roy-Steiner representations of K^−π^+ scattering [5]. However, evidence for the charged partner is still scarce and conflicting [6, 7].

The primary source for the Kπ → Kπ scattering has been the data from the classic LASS experiment [8], K^−p → K^−π^+n. With a cut at low momentum transfers, the K^−p interaction is assumed to be entirely due to the one-pion-exchange mechanism. The incident pion is, therefore, not a real, asymptotically free particle, but a nearly on-shell virtual state. An additonal cut on the π^+n mass was set to avoid baryonic intermediate states. The LASS analysis was performed on a sample containing 151 thousand events. With this sample LASS found that the Kπ cross section is elastic up to the Kη^′ threshold (1.454 GeV/c^2). Unfortunately, LASS data start only at m_{Kπ} = 825 MeV/c^2.

Heavy flavor decays are currently the only way to access the whole elastic range of the Kπ spectrum, starting from threshold. A golden mode for the neutral Kπ system is the decay D^+ → K^−π^+π^+, which has a largely dominant S-wave component — a common feature of three-body final states with identical pions.

This decay was already studied by the Fermilab FOCUS Collaboration [3]. In our previous work the D^+ → K^−π^+π^+ Dalitz plot was analyzed with the K-matrix formalism, which was applied for the first time in Dalitz plot analysis of D decays in the FOCUS study of the D^+ → π^+π^−π^+ decay [9]. As a cross check, a fit with the usual isobar model was also performed.

In the isobar model the S-wave is represented by a coherent sum of a uniform nonresonant term plus two relativistic Breit-Wigner amplitudes. A good fit can be achieved, but it is difficult to determine the relative amount of each S-wave component. In order to illustrate the correlation between the S-wave components of the isobar model an ensemble of 2,000 D^+ → K^−π^+π^+ Dalitz plots was simulated using the set of parameters from our isobar fit (Table 2 of reference [3]). Each simulated Dalitz plot was fitted and a scatter plot of the nonresonant versus κ(800)π^+ decay fractions is presented in Fig. 1. One can clearly see that a better description of the S-wave requires one to go beyond the isobar model.

The K-matrix formalism is based on the assumption that there is no three-body final state interaction. In this approach the dynamics of the K^−π^+π^+ final state are driven by the K^−π^+ system. Data on D decays and on scattering would be directly related and the two-body unitarity would become a constraint. The evolution of the K^−π^+ pair is fixed to that of Kπ elastic scattering, considering the contribution of both I=1/2 and I=3/2 K^−π^+ amplitudes. The parameters of the K^−π^+ production amplitude and the relative amount and phase of the two isospin components are determined by the fit. A good description of the data was obtained, with an important contribution of the I = 3/2 Kπ amplitude. The production amplitude has a slowly varying phase. The conclusion of this study is that data on D decays and scattering are consistent. The three-body final state interactions would, therefore, play a

FIG. 1: Correlation between nonresonant and κπ^+ decay fractions in the isobar model. An ensemble of D^+ → K^−π^+π^+ Dalitz plots was simulated and fitted with the isobar model. The scatter plot shows a high correlation between the two largest contributions of the S-wave.

marginal role.

In this paper we complete our study of the D^+ → K^−π^+π^+ (charge conjugate states are always implied) Dalitz plot, applying, to the same data set, the model-independent partial wave analysis (MIPWA) technique, developed by the E791 Collaboration [10]. In this method, the K^−π^+ S-wave amplitude is parameterized by a generic complex function, to be determined directly from the data. The only assumption common to all other Dalitz plot analyses is that the P- and D-waves are well represented by a sum of Breit-Wigner amplitudes. The K^−π^+ spectrum is divided into slices. The magnitude and phase of the S-wave component at the edge of each slice are determined by the fit. A cubic spline interpolation is used to obtain the S-wave magnitude and phase at any point in the spectrum.

The MIPWA technique provides a model-independent way to determine the K^−π^+ S-wave amplitude. The result, however, is inclusive. The measured phase, in addition to the I=1/2 K^−π^+ phase, may contain contributions from the I=3/2 components, as well as possible contributions from three-body final state interactions.

The paper is organized as follows. In the next section we describe the selection of the data sample. The MIPWA formalism is described in Section III. The results of the MIPWA fit are presented in Section IV.

II. THE D^+ → K^−π^+π^+ SAMPLE

FOCUS is a charm photo-production experiment which collected data during the 1996–97 fixed target run at Fermilab. The photon beam was produced by means of bremsstrahlung, from electron and positron beams (typically with 300 GeV endpoint energy). The electron/positron beams were obtained from the 800 GeV Tevatron proton beam. The photon beam interacted with a segmented BeO target [11]. The mean photon energy for reconstructed charm events is ∼ 180 GeV.

The FOCUS spectrometer has a system of three multi-cell threshold Čerenkov counters to perform the charged particle identification, separating kaons from pions up to a momentum of 60 GeV/c. The identification and separation of charm primary (production) and secondary (decay) vertecis are made by two systems of silicon micro-vertex detectors. The first system consists of 4 planes of micro-strips interleaved with the experimental target [12] and the second system consists of 12 planes of micro-strips located downstream of the target. The charged particle momentum is determined by measuring the deflections in two magnets of opposite polarity through five stations of multi-wire proportional chambers.

The data set used in this analysis is the same as in Ref. [3]. The final states are selected using a candidate driven vertex algorithm [13]. A secondary vertex is formed from the three candidate tracks. The momentum of the resultant

FIG. 2: The K^−π^+π^+ invariant mass distribution.

D^+ candidate is used as a seed track to intersect the other reconstructed tracks and to search for a primary vertex. The primary vertex must have least two reconstructed tracks in addition to the D^+ seed. The confidence level of each vertex is required to be greater than 1%. Once the production and decay vertecis are determined, the distance L between the vertecis and its error σ_L are computed. The quantity L / σ_L is an unbiased measure of the significance of detachment between the primary and secondary vertecis. This is the most important criterium for separating charm events from non-charm prompt backgrounds. Signal quality is further enhanced by isolation requirements. Tracks forming the D candidate vertex must have a confidence level smaller than 0.001% to form a vertex with the tracks from the primary vertex. In addition, all remaining tracks not assigned to either the primary or the secondary vertex must have a confidence level smaller than 0.1% to form a vertex with the D candidate daughters.

Particle identification cuts used in FOCUS are based on likelihood ratios between the various particle identification hypotheses. These likelihoods are computed for a given track from the observed firing response (on or off) of all the cells that are within the track’s (β = 1) Čerenkov cone for each of our three Čerenkov counters. The product of all firing probabilities for all the cells within the three Čerenkov cones produces a χ^2-like variable W_i = −2 ln(Likelihood) where i ranges over the electron, pion, kaon and proton hypotheses [14]. The kaon track is required to have Δ_K = W_π − W_K greater than 3; both pion candidates are required to satisfy Δ_π = W_K − W_π greater than 3; in addition, all tracks are required to be separated by less than 5 units from the best hypothesis, that is ΔW = W_{min} − W_K < 5 and ΔW = W_{min} − W_π < 5 . These Čerenkov cuts reduce the contamination of D^+_s → K^−K^+π^+ background to a negligible level.

Using the set of selection cuts just described, we obtain the invariant K^−π^+π^+ mass distribution shown in Fig. 2. The mass plot of Fig. 2 is fitted with a function that includes two Gaussian functions with different widths and the same mean, which take into account differences in the resolution in the momentum determination of our spectrometer [13], and an exponential function for the background. The events used in the MIPWA fit correspond to the shaded area in Fig. 2, i.e., events with 1.8515 < M_{Kππ} < 1.9031 GeV/c^2. Events in this mass region that lie outside the kinematic limit defined by the nominal D^+ mass are discarded. The final data subset contains 53,595 events, with a purity (S/(S+B)) of 98.8%.

The symmetrized Dalitz plot of these events (two entries per event) is shown in Fig. 3. A narrow band corresponding to the D^+ → K^∗(892)^0π^+ events can be clearly seen. The asymmetry in each K^∗(892)^0 lobe is evident and it is caused by the interference between this state and the K^−π^+ S-wave. Indeed, it is this interference with the P-wave that allows one to access the S-wave phase.

FIG. 3: The K^−π^+π^+ Dalitz plot.

III. THE MODEL INDEPENDENT PARTIAL WAVE ANALYSIS FORMALISM

In the MIPWA formalism the Dalitz plot of Fig. 3 is described by a coherent sum of three partial waves, corresponding to the K^−π^+ system in the angular momentum states L =0, 1 and 2. The partial waves are complex functions of the two Kπ invariant masses squared, s_a = (p_K + p_{πa} )^2 and s_b = (p_K + p_{πb} )^2, which specify the kinematics of the D^+ → K^−π^+_a π^+_b decay. Each partial wave is Bose-symmetrized with respect to the identical pions,

A_L = A_L(s_a, s_b) + A_L(s_b, s_a). (1)

The K^−π^+ S-wave amplitude is an unknown complex function of the K^−π^+ mass squared,

A_0(s_a, s_b) = a_0(s_a)e^{iϕ0 (sa )} + a_0(s_b)e^{iϕ0 (sb)}. (2)

No assumption about the content of the S-wave is made: the real functions a_0(s) and ϕ_0(s) are determined directly by the Dalitz plot fit. The K^−π^+ mass spectrum is divided into 39 slices of the same size. For each of the 40 endpoints s_k there are two free parameters, a_k and ϕ_k , defining the function A_0(s_a, s_b) at that position. A cubic spline interpolation is used to define the values of both a_0(s) and ϕ_0(s) between s_k ≤ s < s_{k+1}. The S-wave has, therefore, a set of 40 pairs (a_k, ϕ_k ) of fit parameters.

The K^−π^+ P-wave amplitude has two components, namely the K^∗(892)^0π^+, taken as the reference mode, and the K^∗(1680)^0π^+,

A_1(s_a, s_b) = F^D_1 (s_a, s_b)F^R_1 (s_a, s_b)[c_0BW_K∗_{(892)}(s_a) + c_1BW_K∗_{1 (1680)}(s_a)]M_1(s_a, s_b). (3)

The D-wave has only one component, the K^∗_2(1430)π^+ mode,

A_2(s_a, s_b) = c_2 [ F^D_2 (s_a, s_b)F^R_2 (s_a, s_b)BW_K∗_{2 (1430)}(s_a) ] M_2(s_a, s_b) (4)

The complex coefficients c_i are also fit parameters, except for c_0, the coefficient of the reference mode, which is fixed to 1.0.

In the above equations F^D and F^R are the usual Blatt-Weisskopf form factors [15],

F_{L=1} = [1 + (rq)^2]^{−1/2}, (5) and F_{L=2} = [9 + 3(rq)^2 + (rq)^4)]^{−1/2}. (6)

where q is the momentum of the resonance decay products in the resonance rest frame. The form factor parameters r = r_D for the D decay vertex, and r = r_R for the resonance decay, are fixed at the values used in Ref. [3]: r_D = 1.5 (GeV/c)^{−1} and r_R = 5.0 (GeV/c)^{−1}.

The functions M_L are the spin amplitudes, accounting for angular momentum conservation. For a spin-1 resonance D^+ → Rπ^+_b , R → K^−π^+_a the corresponding spin amplitude is

M_{L=1} = ∑ M p^μ_{πb} e_μ(p, M)e_ν (p, M)(p_{πa} − p_K )^ν , (7) where e_μ is the resonance polarization vector with magnetic quantum number M, p is the momentum 4-vector and p^μ_i are the momenta of the final state particles. After summing over the unobserved resonance polarization states, the spin amplitude reduces to

M_{L=1} = −2 | ⃗p_{πb} || ⃗p_K | cos θ, (8) where θ is the cosine of the angle formed by ⃗p_K and ⃗p_{πb} in the resonance rest frame.

In the case of the K^∗_2(1430)π^+ mode, the spin amplitude is

M_{L=2} = ∑ M p^μ_{πb} p^ν_{πb} e_μ(p, M)e_ν (p, M)e_α(p, M)e_β(p, M)(p_{πa} − p_K )^α(p_{πa} − p_K )^β , (9) which, after summing over the resonance polarization, reduces to

M_{L=2} = 4 3 (| ⃗p_{πb} || ⃗p_K |)^2(3cos^2θ − 1). (10)

The relativistic Breit-Wigner has an energy dependent width,

BW = 1 s − s_0 + i √ s_0 Γ_{tot}(s)

, (11)

where s is the K^−π^+ mass squared, s_0 the resonance nominal mass and

Γ_{tot}(s) = Γ_0 √ s_0 s ( q q_0

)_{2L+1}

F^2_L(q) F^2_L(q_0)

, (12)

where L is the orbital angular momentum in the rest frame of the decaying resonance.

The signal distribution is corrected on an event-by-event basis for the acceptance. The acceptance includes geometry, detector and selection cuts efficiency. It is determined by a full Monte Carlo simulation of events: the γ−N interaction, event propagation through the spectrometer, event reconstruction and selection of the Kππ sample. The acceptance function is obtained by fitting the Dalitz plot of Monte Carlo events to a 10th order polynomial.

The signal probability distribution is normalized to unity,

P_S (s_a, s_b) = 1 N_S ε(s_a, s_b) | | | ∑ A_L | | |^2 , (13)

where ε(s_a, s_b) is the acceptance function and N_S the overall normalization constant,

N_S = ∫ ds_ads_bε(s_a, s_b) | | ∑ A_L | |^2 . (14)

The background probability distribution is fixed in the fit. The background shape is determined by a fit to the Dalitz plot of events from the K^+π^−π^− mass sidebands [3]. The signal fraction is estimated by a fit to the K^+π^−π^− mass spectrum.

In the MIPWA fit there are 40×2 + 2×2=84 free parameters. The optimum set of parameters is determined by an unbinned maximum likelihood fit, minimizing the quantity w ≡ −2 ln(L), where the likelihood function, L, is given by L = ∏ events [ f_S P^i_S (s_a, s_b) + (1 − f_S )P^i_B (s_a, s_b) ] (15)

where f_s is the signal fraction f_s = S/(S + B).

Decay fractions are obtained from the coefficients c_k, determined by the fit, and after integrating the overall signal amplitude over the phase space,

f_k = ∫ ds_ads_b |c_kA_k(s_a, s_b)|^2 ∫ ds_ads_b | | ∑ j c_j A_j (s_a, s_b) | |^2

. (16)

Errors on the fractions include errors on both magnitudes and phases, and are computed using the full covariance matrix.

IV. RESULTS OF THE MIPWA

The decay fractions resulting from the MIPWA fit are presented in Table I. For comparison, the third and fourth columns have the fractions from our previous fits using the K-matrix formalism and the isobar model [17].

The data is well described by a P-wave model with two components. No improvement in the fit quality is observed when a third component, the K^∗(1410)π^+ mode, is added. The contribution of this mode is consistent with zero. As in previous analyses of the D^+ → K^+π^−π^− Dalitz plot, the S-wave component is dominant. The decay fractions from the MIPWA and from our previous K-matrix Dalitz plot fit are in good agreement.

In Table II the MIPWA decay fractions are compared to the ones from E791 and CLEO-c. Our results are in good agreement with the decay fractions from E791. The total S-wave contribution from CLEO-c is significantly higher if we add the binned and the K^∗_0(1430)π^+ fractions.

The fitted values of the S-wave magnitudes and phases are presented in Table III and plotted in Figs. 4 and 5. The error bars in these figures contain the statistical and systematic errors folded in quadrature. The dashed line in Fig. 4 indicates the Kη^′ threshold, the upper limit of the region where the K^−π^+ amplitude is predominantly elastic [8].

The S-wave phase grows continuously across the elastic region, starting at -138^o and with a total variation of 200^o. After a sudden drop near the K^∗_0(1430) mass, the phase becomes nearly constant.

The S-wave magnitude is a decreasing function up to m_{Kπ} ≃ 1.2 GeV/c^2. There is a dip near the K^∗_0(1430) mass, which is most readily explained by the interference between the different components of the S-wave.

The measured magnitudes are more affected by the systematic uncertainties than are the measured phases. In both cases the systematic uncertainties are comparable to or larger than the statistical errors.

A. Goodness-of-fit

For all fits the goodness-of-fit is accessed through a two-dimensional χ^2 test, using an adaptive binning algorithm. The folded Dalitz plot is divided into 844 cells of variable size, with a minimum occupancy of 50 data events, in such a way that all cells have a nearly equal and sufficiently large population. This procedure allows us to test the fit quality in great detail across the Dalitz plot. For each cell we define the χ^2 as

χ^2_i =

(n_{obs} − n_{exp})^2 σ^2_{exp}

. (17)

TABLE I: Decay fractions (%) from the MIPWA Dalitz plot fit. In the MIPWA column the first error is statistical, the second and third errors are, respectively, our estimate of the split sample and fit variant systematic uncertainties, and the last error is the systematic error due to the uncertainty in the parameters of the other waves. Below the decay fractions and the phases, in degrees, are indicated.

mode FOCUS MIPWA FOCUS K-matrix FOCUS isobar model

K^−π^+ S-wave 80.24±1.38±0.23±0.25±0.26 83.23±1.50±0.04±0.07 -

K^∗(892)^0π^+ 12.36±0.34±0.19±0.16±0.23 13.61±0.41±0.01±0.30 13.7±0.4±0.6±0.3 0 (fixed) 0 (fixed) 0 (fixed)

K^∗(1410)^0 π^+ - 0.48±0.21±0.012±0.17 0.2±0.1±0.1±0.04 - 293±17±0.4±7 350±34±17±15

K^∗(1680)^0 π^+ 1.75±0.62±0.24±0.23±0.42 1.90±0.65±0.01±0.43 1.8±0.4±0.2±0.3 67±6±2±2±3 1±7±0.2±6 3±7±4±8 K^∗_2 (1430)π^+ 0.58±0.1±0.04±0.03±0.04 0.39±0.1±0.004±0.05 0.4±0.05±0.04±0.03 336±7±3±2±2 296±7±0.3±1 319±8±2±2

K^∗_0 (1430)π^+ - - 17.5±1.5±0.8±0.4 - - 36±5±2±1.2

κπ^+ - - 22.4±3.7±1.2±1.5 - - 199±6±1±5

nonresonant - - 29.7±4.5±1.5±2.1 - - 325±4±2±1.2

TABLE II: Decay fractions (%) and phases, in degress, from the MIPWA Dalitz plot fit compared to E791 and CLEO-c.

mode FOCUS MIPWA E791 CLEO-c

K^−π^+ S-wave 80.24±1.38±0.23±0.25±0.26 78.6±2.3 83.8±3.8

K^∗_0 (1430)π^+ - - 13.3±0.62 - - 51 (fixed)

K^∗(892)^0π^+ 12.36±0.34±0.19±0.16±0.23 11.9±2.0 9.88±0.46 0 (fixed) 0 (fixed) 0 (fixed)

K^∗(1680)^0 π^+ 1.75±0.62±0.24±0.23±0.42 1.2±1.2 0.20±0.12 67±6±2±2±3 43±17 113±14

K^∗_2 (1430)π^+ 0.58±0.1±0.04±0.03±0.04 0.2±0.1 0.20±0.04 336±7±3±2±2 -12±29 15±9

In the above expression n_{exp} is the expected population of each cell, given by a Monte Carlo simulation performed with 1,000,000 events generated according to the model resulting from the MIPWA fit, and σ_{exp} is the uncertainty on this number. The overall χ^2 is a sum of the χ^2_i over all cells. The number of degrees-of-freedom is given by the number of cells minus the number of fit parameters. From these two quantities we estimate the confidence level of our fits.

The overall χ^2 of the MIPWA fit is χ^2=818.8 (844-84=760 degrees of freedom), which corresponds to a confidence level of 6.8%. The χ^2 distribution across the Dalitz plot is shown in Fig. 6.

The Dalitz plot projections (highest and lowest K^−π^+ invariant mass squared) are plotted in Fig. 7, with the fit result superimposed (solid histograms).

TABLE III: Magnitudes and phases of the S-wave from MIPWA fit. The first error is statistical. The second and third errors are, respectively, our estimate of the split sample and fit variant systematic uncertainties, whereas the last error is the systematic error due to the uncertanty in the parameters of the other waves. The full systematic error is a sum in quadrature of these three errors. This is the number between parentheses.

K^−π^+ mass (GeV/c^2) a (GeV/c^2)^{−2} ϕ (degrees) 0.63 2.31 ± 0.24 ± 0.02 ± 0.07 ± 0.19 (0.20) -138 ± 10 ± 2 ± 4 ± 6 (7) 0.66 1.76 ± 0.14 ± 0.07 ± 0.06 ± 0.13 (0.16) -121 ± 7 ± 2 ± 3 ± 6 (7) 0.69 2.07 ± 0.14 ± 0.08 ± 0.06 ± 0.13 (0.16) -119 ± 6 ± 3 ± 3 ± 5 (7) 0.72 1.95 ± 0.15 ± 0.01 ± 0.08 ± 0.14 (0.16) -108 ± 5 ± 2 ± 3 ± 6 (7) 0.75 1.68 ± 0.17 ± 0.05 ± 0.09 ± 0.13 (0.17) -92 ± 6 ± 3 ± 2 ± 6 (7) 0.77 1.95 ± 0.16 ± 0.01 ± 0.07 ± 0.15 (0.16) -97 ± 5 ± 3 ± 2 ± 5 (6) 0.80 1.61 ± 0.11 ± 0.05 ± 0.07 ± 0.15 (0.16) -73 ± 5 ± 1 ± 2 ± 7 (7) 0.83 1.69 ± 0.12 ± 0.04 ± 0.09 ± 0.15 (0.17) -70 ± 4 ± 4 ± 1 ± 4 (6) 0.86 1.56 ± 0.15 ± 0.06 ± 0.08 ± 0.14 (0.16) -67 ± 3 ± 4 ± 0 ± 2 (7) 0.89 1.65 ± 0.17 ± 0.03 ± 0.05 ± 0.16 (0.17) -61 ± 2 ± 2 ± 0 ± 2 (3) 0.91 1.75 ± 0.16 ± 0.05 ± 0.06 ± 0.18 (0.19) -53 ± 3 ± 2 ± 0 ± 2 (3) 0.94 1.70 ± 0.11 ± 0.04 ± 0.09 ± 0.15 (0.17) -49 ± 4 ± 2 ± 0 ± 2 (3) 0.97 1.58 ± 0.07 ± 0.04 ± 0.05 ± 0.13 (0.14) -31 ± 7 ± 2 ± 1 ± 4 (5) 1.00 1.61 ± 0.06 ± 0.03 ± 0.05 ± 0.10 (0.12) -31 ± 6 ± 3 ± 1 ± 4 (5) 1.03 1.58 ± 0.05 ± 0.03 ± 0.03 ± 0.10 (0.11) -23 ± 6 ± 1 ± 1 ± 3 (3) 1.06 1.69 ± 0.05 ± 0.04 ± 0.03 ± 0.14 (0.15) -26 ± 5 ± 2 ± 0 ± 2 (3) 1.08 1.60 ± 0.05 ± 0.02 ± 0.03 ± 0.12 (0.13) -17 ± 4 ± 2 ± 0 ± 2 (3) 1.11 1.53 ± 0.05 ± 0.04 ± 0.02 ± 0.13 (0.13) -11 ± 4 ± 1 ± 0 ± 2 (2) 1.14 1.52 ± 0.05 ± 0.03 ± 0.01 ± 0.11 (0.11) -9 ± 3 ± 2 ± 0 ± 1 (2) 1.17 1.60 ± 0.05 ± 0.01 ± 0.01 ± 0.10 (0.10) 0 ± 3 ± 1 ± 0 ± 1 (1) 1.20 1.60 ± 0.05 ± 0.05 ± 0.01 ± 0.08 (0.09) -1 ± 3 ± 1 ± 0 ± 1 (1) 1.22 1.67 ± 0.05 ± 0.05 ± 0.01 ± 0.07 (0.08) -1 ± 3 ± 1 ± 1 ± 1 (2) 1.25 1.71 ± 0.05 ± 0.04 ± 0.01 ± 0.11 (0.12) 7 ± 4 ± 1 ± 1 ± 1 (2) 1.28 1.77 ± 0.05 ± 0.05 ± 0.01 ± 0.11 (0.12) 7 ± 4 ± 1 ± 1 ± 1 (2) 1.31 1.78 ± 0.05 ± 0.04 ± 0.02 ± 0.10 (0.11) 9 ± 4 ± 2 ± 1 ± 2 (3) 1.34 1.69 ± 0.05 ± 0.01 ± 0.02 ± 0.10 (0.10) 15 ± 4 ± 1 ± 1 ± 2 (3) 1.36 1.74 ± 0.06 ± 0.05 ± 0.02 ± 0.10 (0.11) 24 ± 4 ± 1 ± 1 ± 2 (3) 1.39 1.69 ± 0.06 ± 0.07 ± 0.01 ± 0.11 (0.13) 26 ± 5 ± 1 ± 1 ± 2 (3) 1.42 1.39 ± 0.07 ± 0.05 ± 0.01 ± 0.09 (0.11) 31 ± 6 ± 2 ± 2 ± 3 (6) 1.45 1.04 ± 0.08 ± 0.01 ± 0.03 ± 0.10 (0.10) 48 ± 6 ± 3 ± 3 ± 4 (6) 1.48 0.66 ± 0.09 ± 0.01 ± 0.05 ± 0.09 (0.11) 64 ± 7 ± 1 ± 3 ± 5 (6) 1.51 0.52 ± 0.06 ± 0.01 ± 0.01 ± 0.11 (0.11) 23 ± 12 ± 1 ± 4 ± 4 (6) 1.53 0.48 ± 0.05 ± 0.04 ± 0.06 ± 0.08 (0.11) -6 ± 13 ± 1 ± 4 ± 6 (7) 1.56 0.80 ± 0.05 ± 0.06 ± 0.05 ± 0.09 (0.12) -23 ± 9 ± 1 ± 2 ± 5 (6) 1.59 1.15 ± 0.07 ± 0.03 ± 0.08 ± 0.08 (0.11) -29 ± 8 ± 1 ± 1 ± 4 (4) 1.62 1.43 ± 0.06 ± 0.04 ± 0.05 ± 0.09 (0.11) -15 ± 7 ± 1 ± 2 ± 3 (4) 1.65 1.56 ± 0.08 ± 0.06 ± 0.09 ± 0.10 (0.14) -19 ± 7 ± 3 ± 1 ± 3 (4) 1.67 1.71 ± 0.10 ± 0.02 ± 0.08 ± 0.11 (0.13) -15 ± 8 ± 3 ± 2 ± 3 (5) 1.70 1.53 ± 0.13 ± 0.04 ± 0.10 ± 0.12 (0.16) -24 ± 9 ± 4 ± 2 ± 4 (6) 1.73 1.60 ± 0.16 ± 0.06 ± 0.10 ± 0.15 (0.19) -34 ± 14 ± 5 ± 3 ± 6 (8)

B. Systematic uncertainties

Systematic uncertainties may come from different sources. We have performed split sample studies, in which the data was divided into four sets of independent samples, according to the parent D meson charge and momentum. The split sample component takes into account the possible systematics introduced by a residual difference between data and Monte Carlo, due to a possible mismatch in the reproduction of the D^+ production. A technique, employed in FOCUS and modeled after the S-factor method from the Particle Data Group [16], was used to try to separate true systematic variations from statistical fluctuations. We found a small effect from the split sample studies.

A second class of studies is the fit variant, in which the fit of the whole data set is performed under different conditions. Fit variants included changes in the background level and in the first derivatives of the spline at the edges of the K^−π^+ spectrum. The fit variant component can be estimated by the r.m.s. of the measurements.

The third and dominant source of systematic errors comes from the uncertainty in the parameters of the P- and D-waves. This includes uncertainties on the values of the parameters r_R and r_D . We repeated the fit changing by

FIG. 4: The S-wave phase as a function of the K^−π^+ mass from the MIPWA K^−π^+π^+ Dalitz plot fit. The hashed vertical line shows the elastic range according to LASS.

FIG. 5: The S-wave magnitude as a function of the K^−π^+ mass from the MIPWA K^−π^+π^+ Dalitz plot fit.

±1σ, one at a time, the values of the mass and width of the high-mass vector resonances, according to the PDG, and of the parameters r_R and r_D . This component is also estimated by the r.m.s. of the measurements.

The contributions of each source are quoted individually in Table I, II and III. The overall systematic uncertainty was obtained adding in quadrature the three components described above, and corresponds to the values in parentheses in Table III.

FIG. 6: The χ^2 distribution across the folded Dalitz plot.

FIG. 7: Comparison between the K^−π^+π^+ Dalitz plot projections and the MIPWA fit, with the lowest (left plot) and highest (right plot) K^−π^+ invariant mass squared. In the plots the solid histogram is a projection of the fit.

V. SUMMARY AND CONCLUSIONS

A Dalitz plot fit was performed with the MIPWA technique. The K^−π^+ S-wave amplitude was determined directly from data, with no assumption about its nature. The only hypotheses are that the decay amplitude can be described by a sum of partial waves, and that the P- and D- waves are well described by a coherent sum of Breit-Wigner amplitudes.

The MIPWA decay fractions are in good agreement with our previous analysis and with the E791 results. A large dominance of the S-wave component is observed in this decay.

The phase of the S-wave amplitude grows continuously across the elastic range, with a total variation of approximately 200^o. At the K^−π^+ threshold there is a phase difference of approximately -140^o between the S- and P-waves.

The phase variation of the S-wave measured in this analysis and that of E791 agree well, specially in the elastic range. Our definition of the S-wave amplitude, eq. 2, differs from that of E791. The latter includes a Gaussian form

FIG. 8: Comparison between the S-wave phase from the three different FOCUS fits of the K^−π^+π^+ Dalitz plot. Points with error bars are the result of the MIPWA fit. The solid line is the central value of the isobar fit. The dashed line is the result of the K-matrix fit.

factor, so one should compare the S-wave magnitude from our analysis to the product of the E791 Gaussian form factors and magnitude. We also find a qualitative agreement between the S-wave magnitude measured by the two experiments.

FOCUS has performed a comprehensive study of the D^+ → K^−π^+π^+ Dalitz plot. Using the same events, fits with the isobar model, the K-matrix formalism and the MIPWA were performed. The three fits have equivalent goodnessof-fit. The decay fractions from all fits are in good agreement. In the isobar model there is a strong correlation between the nonresonant and κπ modes. Although a good fit with this model is achieved, it is difficult to disentangle the contribution of these two modes.

In Fig. 8 the S-wave phase from the three fits are compared. All fits show a good agreement in the interval 1 < m_{Kπ} < 1.35 GeV/c^2. The MIPWA phase is lower than those from the isobar/K-matrix fits for m_{Kπ} < 1 GeV/c^2. In the high mass region the rapid variation of the phase is more pronounced in the isobar/K-matrix fits than in the MIPWA.

The S-wave magnitude from the three fits are compared in Fig. 9. In the isobar and K-matrix fits there is a broad maximum at around 0.9 GeV/c^2, which is absent in the MIPWA fit. In the region 1.2 < m_{Kπ} < 1.4 GeV/c^2 the MIPWA magnitude has a bump whereas in the isobar and K-matrix the magnitude decreases. In the high mass region, after the minimum, the magnitude from the MIPWA fit has a steeper variation than that of the isobar and K-matrix.

The D^+ → K^−π^+π^+ decay offers an opportunity to access the K^−π^+ S-wave amplitude near threshold. Except for heavy flavor decays, no new data on the K^−π^+ system are foreseen. The ultimate goal is to extract the I=1/2 K^−π^+ elastic amplitude, where all resonances are contained. The result of the MIPWA fit, however, may include other effects, such as a possible contribution of the I=3/2 amplitude, or an energy dependent phase introduced by three-body final state interactions. The road from the MIPWA S-wave to the I=1/2 K^−π^+ elastic amplitude is, unfortunately, not direct. Input from theory is necessary. At this level of statistics we are already limited by systematics, which are dominated by the uncertainties on resonance parameters.

We wish to acknowledge the assistance of the staffs of Fermi National Accelerator Laboratory, the INFN of Italy, and

FIG. 9: Comparison between the S-wave magnitude from the three different FOCUS fits of the K^−π^+π^+ Dalitz plot. Points with error bars are the result of the MIPWA fit. The solid line is the central value of the isobar fit. The dashed line is the result of the K-matrix fit.

the physics departments of the collaborating institutions. This research was supported in part by the U. S. National Science Foundation, the U. S. Department of Energy, the Italian Istituto Nazionale di Fisica Nucleare and Ministero della Istruzione Università e Ricerca, the Brazilian Conselho Nacional de Desenvolvimento Científico e Tecnológico and FAPERJ, CONACyT-México, and the Korea Research Foundation of the Korean Ministry of Education.

[1] E.M. Aitala et al. (E791 Collaboration), Phys. Rev. Lett. 89, 121801 (2002). [2] M. Ablikim et al. (BES Collaboration), Phys. Lett. B598, 149 (2004). [3] J.M. Link et al. (FOCUS Collaboration), Phys. Lett. B653, 1 (2007). [4] G. Bonvicini et al. (CLEO-c Collaboration), Phys. Rev. D78, 052001 (2008). [5] S. Descotes-Genon and B. Moussallam, Eur. Phys. J. C48, 553 (2006). [6] B. Aubert et al. (BaBar Collaboration), Phys. Rev. D76, 011102 (2007). [7] D. Epifanov et al. (Belle Collaboration), arXiv:0706.2231. [8] D. Aston et al. (LASS Collaboration), Nucl. Phys. B296, 493 (1988). [9] J.M. Link et al. (FOCUS Collaboration), Phys. Lett. B585, 200 (2004). [10] E.M. Aitala et al., (E791 Collaboration), Phys. Rev. D73, 032004 (2006). [11] P.L. Frabetti et al., (E687 Collaboration), Nucl. Instrum. Meth. A329 (1993) 62. [12] J.M. Link et al., (FOCUS Collaboration), Nucl. Instrum. Meth. A516(2004) 364. [13] P.L. Frabetti et al., (E687 Collaboration), Nucl. Instrum. Meth. A320 (1992) 519. [14] J.M. Link et al., (FOCUS Collaboration), Nucl. Instrum. Meth. A484 (2002) 270. [15] J.M. Blatt and V.F. Weisskopf, Theoretical Nuclear Physics (John Wiley & Sons, New York, 1952). [16] C. Amsler et al. (Particle Data Group), Phys. Lett. B667, 1 (2008).

[17] The two statistical errors here reported on the K^∗(892)^0π^+ decay fraction for both the K-matrix and isobar fits are smaller than those quoted in Ref. [3]. They were overestimated in Ref. [3] as a consequence of a minor mistake in the error propagation code, which affected their computation only and not those of the other fit fractions. The two new values reported here are the correct ones, and should replace the old ones.