arXiv:0906.4232v1 [astro-ph.HE] 23 Jun 2009

LYCEN-2009-07

DIRECT DARK MATTER SEARCHES AND THE EDELWEISS-II EXPERIMENT

J. GASCON IPNL, Université de Lyon, Université Lyon 1, CNRS/IN2P3, 4 rue E. Fermi, 69622 Villeurbanne, France

Direct searches for Dark Matter are experiment dedicated to the observation of the energetic recoiling ions produced by the scattering of WIMP particles from our galactic halo on terrestrial targets. The status and prospects of some currently running experiments are presented, together with new preliminary results of the experiments EDELWEISS-II.

1 Introduction

Direct searches of Dark Matter1 consist in experiments dedicated to the observation of the recoiling ions produced by the scattering of Dark Matter particles from our galactic halo on terrestrial targets. This endeavour is motivated by the gathering of evidence for the presence of cold Dark Matter at all scales of the Universe (as in, e.g. Ref.2). In addition, many of the supersymmetric models that are soon to be tested at the LHC offer a valid candidate for these Weakly Interacting Massive Particles (WIMP): the neutralino.

Cosmological observations have revealed the presence of Dark Matter, and continue to provide increasing details to its distribution, past and present, in the Universe. However, it is only by producing these new particles at colliders that it will be possible to ascertain their true nature. The observation of WIMP scattering on a terrestrial target at the expected rate would be crucial for establishing a formal link between cosmological Dark Matter and a given particle. Another crucial test would be the observation in cosmic rays of remnants from WIMP annihilations. This is the subject of indirect searches, which are covered by other presentations at this conference. These two types of searches are complementary. For instance, in indirect searches, the signal strength depend on both the scattering and the annihilation cross-sections of WIMPs, as well as the square of the WIMP density. In direct searches, the rate is a linear function of the WIMP density and, for a given density, it depends on the scattering cross-section only.

Currently running experiments are sensitive to rates of the order of one WIMP interaction per month and per kg of target. In terms of a spin-independent coherent scattering on a nucleon, this correspond to a scattering rate of 5×10^{−8}pb, approaching the supersymmetric model predictions in the so-called ”Focus Point” region. A more comprehensive coverage of supersymmetric model predictions requires sensitivity to cross-section of the order of 10^{−9} to 10^{−10} pb. This corresponds to rates of the order of one interaction per year and per ton, which is the challenging goal of future projects.

2 Principles of Direct Dark Matter Searches

The relevant scale for direct Dark Matter searches can be set using general arguments. First, the velocity of the WIMP particles in our vicinity must be similar to the typical velocity of any other object trapped in the gravitational well of our Galaxy, i.e. approximately 200 km/s. An appropriate mass scale for the WIMP is that at which supersymmetric particle are expected and sought for: ∼100 GeV within one order of magnitude. From these two numbers we can conclude that the elastic collision of a WIMP with a nucleus should give it a kinetic energy ot the order of 20 keV. This average does not vary significantly when more realistic velocity distributions are considered3. More precise predictions require a better understanding of Dark Matter halo shapes, density profiles and velocity distributions. The question of their homogeneity could have significant impact on the observable scattering rate.

The event rate depends on the local WIMP density and on the scattering cross-section. The actual shape of the Dark Matter halo is the subject of intense debate, especially for its most inner part. Luckily, the sun lies in the outer part of the visible disk of our Galaxy, where there is less uncertainty on the WIMP density. A value of 0.3 GeVcm^{−3} is generally adopted, at least in models where inhomogeneities do not play a significant role. The cross-section predictions are model-dependent. In most models, the scattering cross-section of a WIMP on a nucleus is dominated by the coherent spin-independent interaction on all nucleons. In order to compare their relative sensitivities, most experiments express their rates, expressed as events per unit of detector mass and exposure time, in terms of the spin-independent WIMP scattering cross-section on a single nucleon, using the standard prescriptions of Lewin and Smith3. These cross-sections can also be compared with model predictions, although this operation is more model dependent than detector-to-detector comparisons. Current supersymmetric model predictions for the WIMP-nucleon cross-section are typically in the range from 10^{−8} to 10^{−10} pb. The range has evolved in time as new observations in particle physics and cosmology have brought additional constraints on supersymmetric parameters. Direct searches are also starting to constrain it, with CDMS4 and XENON5 having reached recently sensitivites of the order of 5×10^{−8} pb.

The true challenge of direct searches doesn’t lie in the relative uncertainty of the predicted rate, but rather in its extremely low value. As an example, a of one event per kg per year is then order of magnitude below the natural activity in the the human body. Modern neutrino experiments are accustomed to interaction rates of a few events per day and per kiloton of target material, but in this case the energy scale of interactions is the MeV. In dark matter searches, the energy released is one hundred times less, and can be comparable to X rays from relatively light materials. Dark Matter searches are probing a domain of ultra-low radioactivity in an energy domain that has never been probed before. It can do it successfully by using powerful discrimination techniques, but the required high rejection rates require a detailed understanding of the tails of the distributions of the discriminating variables, and an excellent detector reliability.

Direct Search detectors must be build with materials with extremely low radioactivity, and protected from the ambient background by efficient shields. Cosmic activation is reduced by installing the experiments in deep-underground sites. Nevertheless, these measures are not sufficient to reduce the background to the required levels, and an active rejection of background is required. The most efficient discrimination strategy is to identify the nature of the recoiling particle. In the case of a WIMP scattering, it is a heavy ion, often called ”nuclear recoil”. The bulk of the natural radioactivity involves electron recoils, either due to Compton or photoelectric gamma-ray interactions, or to β rays. Nuclear recoils are stopped in less than 20 nm in a solid substrate. It is thus very difficult to extract information on the direction of ion recoils, and for this reason no large detector has yet the sensitivity to detect the directionality of the WIMP flux due to the sun velocity. However the linear energy loss of a heavy ion is significantly more important than the value for an electron of the same energy. This feature is exploited in detectors like PICASSO6 and COUPP7, where this large energy density is used to trigger bubble formation in superheated liquids.

Another significant difference between nuclear and electron recoils is the relative ionization and scintillation yields associated with the interaction. For example, a ion recoiling in a crystal will dissipate most of its energy in lattice deformations and vibrations, resulting into phonon excitations that will quickly decay into a thermal equilibrium. A recoiling electron interacts directly with the other electrons and has a larger ionization yield. The relative ionization yield of the two processes is well described by the Lindhard theory8. In germanium, the ratio of yields is three to four, depending on the energy range. Scintillation yields can vary by even larger amounts9. Many experiments are developing detectors where the discrimination is based on the comparison of two signals, such as ionization and scintillation5^,10, scintillation and heat11 or ionization and heat4^,12

After the nuclear recoil identification is applied, a remaining background is the one associated with the elastic scattering of fast neutrons on target nuclei. The neutron flux on the detector must be moderated with a thick low-A shield. The most sensitive experiments must also contend with the flux of neutron due to the interactions in the detector support and the gamma-ray shielding of the few cosmic rays that can reach the underground site. The experiments are surrounded by an active veto that can tag these muons. Neutron interactions can also be tagged by their short (∼cm) mean free-path in solids. As a consequence, neutrons tend to be associated with surface events in large-volume detectors, and with multiple-hit events in segmented detector arrays. However, the similarity of the detector response to neutron and WIMP interactions is very useful for a precise on-site calibration of the detector.

Given the uncertainties associated with the ultra-low background required for these experiments, it is essential to develop detectors with more than one type of target nucleus in order to exploit the A^2-dependence of the cross-section which is expected for a coherent spin-independent scattering. Targets with nuclear spins are of interest to investigate the special case where the spin-dependent cross-section dominates despite the A^2-scaling of the spin-independent one. With clean samples of more than 10^4 WIMPs interactions, it may also be worth to look for seasonal variations of the rate, although the actual size and phase of the modulation depends on the details of the halo model (see e.g. Ref.13).

From the A^2-dependence of the coherent cross-section, one could conclude that the detectors with the largest-A target are favoured. This is not systematically the case. This dependence is partially offset by nuclear form factor effects3. More importantly, the observed rate has a strong dependence on the achieved experimental threshold. The currently-running experiments with the best sensitivities use a variety of targets and techniques. The largest progress usually comes from the improved understanding of backgrounds, the tight control of detector imperfections and the steady technological advances to get rid of both of them. This favours technologies offering enough precision and versatility for studying in details the present-day backgrounds and detector imperfections.

3 Currently running experiments

3.1 Experimental limits

At present, the best experimental limits for spin-independent scattering cross-section for WIMPs masses above 40 GeVc^{−2} are those of the CDMS experiment4. At lower masses, the experiment XENON5 provides the best limits. In both cases, the best limits are at the level of 5×10^{−8}pb at 90%CL. The limits are above 10^{−7}pb in the WIMP mass range from 15 to 1000 GeVc^{−2}. The sensitivity degradation at low masses is due to the experimental thresholds. At high masses, it is caused by the asymmetry between the target and projectile masses. These limits are two order of magnitude below the interpretation of the DAMA oscillation, discussed in this conference, in terms of WIMP using Lewin and Smith prescriptions. Reconciling this oscillation with the limits from the searches requires a significant departure from these prescriptions and has prompted a wealth of alternate specific models. Solutions involving WIMPs with dominant spin-dependent interactions on protons are at odds with the limits from the experiments COUPP7 and KIMS14. WIMPs with masses below the XENON and CDMS limits are excluded by the high-resolution germanium experiment CoGeNT15

These alternative models widen the choice of detector technologies and experimental strategies. However, the best sensitivities to WIMPs corresponding to the more standard mSUGRA models that will be tested at LHC are attained by detectors aiming at coherent spin-independent interactions. In the following, we will briefly describe the two most sensitive experiments at present, CDMS and XENON, and present the recent progress of the EDELWEISS with germanium detectors demonstrating an unprecedented rejection of events associated to surface contaminations.

3.2 XENON two-phase detector

As mentioned before, the discrimination of electron and nuclear recoils of this type detector is based on the difference in the relative ionization and scintillation yields. Rare gases are a prized target material, as a very high-radiopurity can be achieved by multiple purification cycles. In rare gases, the scintillation comes from the de-excitation of a meta-stable excimer, efficiently produced in atomic collisions. Ionization is less efficient at producing this excimer. The principle of the XENON-10 detector5 is the following: a cylindrical cell is filled with 10 kg of liquid xenon, viewed by two arrays of ∼45 photomultipliers, one at the bottom and one at the top. The first signal comes from the scintillation observed directly following the interaction. An intense electric field drifts the electrons toward the top surface. They are further accelerated in the gaseous phase above the liquid, creating a secondary pulse of scintillation proportional to the ionization yield. The ratio of the secondary signal to the primary signal varies by a factor ∼ 0.4 depending on the nature of the recoil.

In addition to this ratio, the detector provides full 3-dimensional coordinates of the primary interaction. The position along the vertical axis is given by the time delay between the two pulses, and the position along the plane is deduced from the signal intensity in the different photomultipliers. As most interactions due to the radioactive background occur near the surface of the xenon volume, only those occurring in the inner fiducial volume of 5.4 kg are considered. The limits reported by XENON are based on a total of 10 events observed in 59 days in this fiducial volume. The discrimination performances are limited by the statistics of scintillation photons. The observed events can be interpreted as the effect of the pile-up of Compton interactions, with one of them occurring outside the active volume for charge collection. This imperfection should be cured in the next generation of the experiment, XENON-100, currently being commissioned in the Gran Sasso National underground Laboratory. Another improvement should be an increase of the light collection, to get a better separation of nuclear and electron recoils.

Another two-phase experiment using xenon is ZEPLIN-III10. Alternatively, other experiments, like ArDM16, WArP17, and DEAP/CLEAN18 plan to use argon instead of xenon as a target. The lower atomic mass is offset by the use of a cheaper and more readily available material, and the possibility to identify nuclear recoils by using a pulse shape discrimination exploiting the long (∼ μs) lifetime of one of the excimer states. This technology must contend with the important radioactive background from the naturally occurring radioisotope^{39}Ar (10^5 decay per kg per day).

3.3 CDMS

The experiment CDMS has obtained its limits on WIMP interaction using an array of fifteen 250 g cryogenic germanium detector, with the simultaneous measurement of phonon and ionization signals. These detectors have two natural advantages: both phonon and ionization measurements have typical energy resolutions of one keV or less, and the radioactivity of hyperpure semiconductor crystals is extremely low. The response to nuclear recoils for this material is known in detail19.

The ionization signal is collected using electrodes covering the surface of the crystal. The phonon signal is measured using an array of four quadrants of ∼1000 transition-edge tungsten sensors, covering one face of the detector. This system has a large acceptance to out-of-equilibrium phonons. As a result, the relative size of the phonon signal in the four quadrants depends on the position of the interaction in the plane parallel to the sensor. Using the amplitudes recorded in the four quadrants, it is possible to reconstruct both this location, with a mm precision, and the energy, with a keV resolution. What is gained by the sensitivity to athermal phonons is an event-by-event information of the time structure of the build-up of the signal. The phonon signal rise time and its delay relative to the fast ionisation signal are of the order of a few μs. It is observed that these time constants are systematically larger for phonons associated with nuclear recoils, relative to those arising from electron movements4.

These detectors thus provide two independent discrimination variables for the identification of nuclear recoil: the ionization yield relative to the total calorimetric energy measured by the phonon sensor, and the time structure of the phonon signal. This double discrimination is important, since the ionization yield measurement is degraded for surface events, where a substantial fraction of the charge may be lost due to trapping and diffusion effects. With this discrimination, CDMS was able to accumulate a fiducial exposure of 121 kgd with no events observed in the region where nuclear recoils are expected. The background due to surface events with bad charge collection for that experiment was estimated to be 0.6±0.3 events. More data is being recorded and analysed now, and with the development of more efficient background cuts, the experiment should reach a sensitvity to spin-independent cross-sections of 2×10^{−8}pb by the end of 2009. The collaboration is preparing for the next generation of arrays with total germanium masses of 40 kg to 190 kg (superCMDS) and an eventual one-ton stage (GEODM).

3.4 EDELWEISS

The experiment EDELWEISS uses 350 g germanium cryogenic detectors, installed in the Laboratoire Souterrain de Modane (LSM) in the Frejus Tunnel between Italy and France. This deep underground site is well suited for experiments aiming at sensitivities well below 10^{−8}pb. As CDMS, its detectors use the ratio of the ionization yield to the phonon signal to identify nuclear recoils. Here, the phonon measurement is provided by a simple GeNTD thermistance, glued to the detector. The signal is purely thermal, with a uniform response over the entire detector volume. In contrast with CDMS, the rejection of events with incomplete charge collection is not based on the phonon signal, but on ionization. The electrodes on the flat surfaces of the

Figure 1: Ionization yield as a function of recoil energy recorded in EDELWEISS InterDigit detectors (ID) recorded in calibrations with a^{210}Pb (left) and^{133}Ba (right) source (taken from Ref.20). The pannels (a) and (b) show the effect of surface event rejection on the population of γ, β and α rays from the source (see text for explanation). The remaining γ and K-shell X-ray population along the ionization yield of one in pannel (b) comes from natural background. The right pannel show the rejection for γ-rays.

cylindrical detectors are replaced by concentric, annular interleaved electrodes, with a pitch of 2 mm. With this ”InterDigit” electrode design (ID)20, surface events are tagged by the presence of charge on two electrodes on the same side of the detector. The phonon measurement is provided by a simple GeNTD thermistance, glued to the detector.

This method is very efficient to reject surface interaction, as shown in Fig. 1a and b, where the ionization yield of events recorded in a detector exposed to a^{210}Pb source are shown as a function energy. The data of Fig. 1a is dominated by β and α rays. When the rejection criteria are applied, only one β event remains in the region where nuclear recoils are expected (dashed lines around ionization yields of ∼0.3 in Fig. 1b). This corresponds to a rejection factor of ∼10^5 for this type of events. This is amply sufficient to reject the observed surface contamination in EDELWEISS, measured at rate of a few events per day per detector21. Fig. 1c shows that the rejection for γ-ray events can reach the value of 10^4 that is required for reaching a sensitivity of 10^8pb.

These ID detectors were designed, build and tested in 2007 and 2008. The EDELWEISS collaboration is now operating ten 400 g ID detectors in its low-background facility at the LSM. The radioactive backgrounds in this setup has been thouroughly studied in 2007 and 2008 using detectors without the interleaved design. They have been reduced relative to the previous setup of the experiment12. The muon veto has been commissionned, and is observing coincidences with the germanium array at the levels of a few events per 100 kgd. In 2008, an fiducial exposure of 18.3 kgd was recorded with the first two 400 g ID detectors (Fig. 2a). No nuclear recoils were observed, down to a threshold of 10 keV in recoil energy. The efficiency for nuclear recoils reaches its plateau below a recoil energy of 15 keV.

This data was interpreted in terms of limits for spin-independent scattering cross-section for WIMPs, as a function of their mass (Fig. 2b). This limit is comparable to what has been obtained in an exposure of 93.6 kgd of detectors without the ID design, despite the five-fold difference in exposure. This shows the importance of surface event rejection, as the limit derived from the larger exposure is constrained by the appearance of three nuclear recoil candidates in

Figure 2: Left: Ionization yield as a function of recoil energy recorded in EDELWEISS InterDigit detectors (ID) recorded in and exposure of 18.6 kgd. Right: 90% CL limits for spin-independent scattering cross-section for WIMPs as a function of the WIMP mass. The curves are (from top to bottom, above 100 GeV): the 2005 results from EDELWEISS in its previous setup; the result of the 18.3 kgd recorded with detectors with ID electrode design; the 2008 results in the new setup with 93 kgd without the ID electrode design and the CDMS combined limit.

the range from 30 to 45 keV. With the increase of number of ID detectors (from two to ten) and of the exposure, EDELWEISS should reach a sensitivity to ∼5×10^{−8} by the end of 2009. Further improvements should come with the addition of new detectors, and by the development of detectors with an increased fiducial volume. The ID technology has proved to be a simple and efficient way to address the problem of surface events, and current studies of muon-induced events seem to suggest that the present EDELWEISS setup could be suitable to probe crosssections of the order of 10^{−9}pb. Further developments are being studied in the framework of the EURECA22 collaboration.

4 Prospects and conclusions

In the domain of direct Dark Matter searches, there is an intense competition between detectors with different target nuclei and detector technologies. This is a welcome diversity since the observation of a WIMP signal will necessarily require confirmation, ideally in a detector with a target nucleus with a different atomic mass. At present, the germanium cryogenic detectors of CDMS and two-phase detector of the XENON collaboration have achieved the best sensitivities. Present limits are just starting to probe the 10^{−8}pb range where an important class of supersymmetric models relevant for LHC are lying. Both collaborations are developing more ambitious projects aiming at cross-sections in the range of 10^{−9}pb and eventually 10^{−10}pb. In Europe, the efforts for cryogenic detectors have been federated in the collaboration EURECA, aiming at deploying a ton-size array of heat-and-scintillation and heat-and-ionization detectors in the future extension of the LSM laboratory.

It is not yet clear what detector technology will take the lead in the coming years. The present results shown that two-phase detectors and cryogenic germanium arrays are serious contenders. Two-phase detectors offer large masses, but the problem of light yield must be closely addressed, as it affects the discrimination capabilities. The problem associated with long drift lengths requires also attention. Cryogenic detectors have a better resolution and their rejection is superior, but scaling up raises the questions of price and optimal detector size. One should not exclude that other technologies may catch up and surpass present-day sensitivities. This competition is however vital for the field, as the formal identification of the WIMP as a new particle in large abundance in our environment will be a small revolution that will call for extensive experimental verification.

Acknowledgments

The author wishes to thank the organizers of this wonderful conference, and the EDELWEISS Collaboration for making available their preliminary data for this review.

References

1. G. Jungman, M. Kamionkowski, and K. Griest, Phys. Rep. 267, 195 (1996); G. Bertone, D. Hooper and J. Silk, Phys. Rep. 405, 279 (2005).

2. E. Komatsu, et al., Astrophys. J. Suppl. 180 (2009) 330. 3. J.D. Lewin and P.F. Smith, Astropart. Phys. 6 (1996) 87. 4. Z. Ahmed et al., Phys. Rev. Lett. 102 (2009) 011301. 5. J. Angle et al., Phys. Rev. Lett. 100 (2008) 21303. 6. F. Aubin et al., New J. Phys. 10 (2008) 103017. 7. E. Behnke et al., Science 319 (2008) 933.

8. J. Lindhard et al, K. Dan. Viderask. Selsk., Math. Fys. Medd 33 (1963) 10 and 36 (1968) 10.

9. I. Bavykin et al., Astroparticle Physics 28 (2007) 489. 10. V. N. Lebedenko et al., arXiv:0812.1150 [astro-ph]. 11. G. Angloher et al., Astroparticle Physics 31 (2009) 270. 12. V. Sanglard et al., Phys. Rev. D 71 (2005) 122002 . 13. C. Savage, K. Freese and P. Gondolo, Phys. Rev. D 74 (2006) 043531. 14. H.S. Lee et al., Phys. Rev. Lett. 99 (2007) 091301. 15. C. E. Aalseth et al., Phys. Rev. Lett. 101 (2008) 251301. 16. L. Kaufmann and A. Rubbia, J. Phys. Conf. Ser. 60 (2007) 264. 17. P. Benetti et al., Nucl. Instrum. Meth. A 574 (2007) 83. 18. M.G. Boulay and A. Hime, Astropart. Physics 25 (2006) 179. 19. A. Benoit et al., Nucl, Instr. Meth. in Phys. Res. A 577 (2007) 558. 20. A. Broniatowski et al., arXiv:0905.0753[astro-ph]. 21. S. Fiorucci et al., Astropart. Phys 28 (2007) 143. 22. H. Kraus et al., J. Phys. Conf. Ser. 39 (2006) 139.