arXiv:0907.4997v1 [astro-ph.HE] 28 Jul 2009

PROCEEDINGS OF THE 31^{st} ICRC, ŁÓDŹ 2009 1

VERITAS Observation of Gamma-Ray Bursts

Nicola Galante^∗ for the VERITAS Collaboration^†

∗Harvard-Smithsonian Center for Astrophysics, USA, ngalante@cfa.harvard.edu †see R.A. Ong et al (these proceedings) for a full author list

Abstract. During its first cycle of observations, VERITAS observed several GRBs in response to broadcast alerts from the Gamma-ray bursts Coordinates Network (GCN). The GRBs were followed up and observed thereafter with typical delays of 2 to 4 minutes from the beginning of the burst and of 92 s in the best case, searching for a very high energy (VHE) component above 100 GeV. The aim of the search for VHE emission from GRBs is to understand the behavior, composition and dynamics of the most accelerated particles in the bursts, as well as to get a better overall understanding of the model of GRBs. We report on the results from two years of observations by VERITAS.

Keywords: VERITAS GRB TeV

I. INTRODUCTION The study of γ-ray bursts at different wavelength has revealed many features that suggest a connection between GRBs and some specific catastrophic events, particularly for what concerns the class of long bursts that are thought to arise fom extremely energetic supernovae, hypernovae. The X-ray instruments currently monitoring the sky are capable to promptly broadcast accurate coordinates in case of a trigger due to a GRB, allowing ground-based telescopes to perform an immediate follow-up observation.

The very upper end of γ-ray bursts has not been described yet by the very high energy (VHE: E > 100 GeV) γ-ray telescopes operating so far although several attempts have been already done by the current generation of air Cherenkov telexcopes [1] [2]. However, several hints of a VHE component have already been given by the past and present γ-ray observatories. The EGRET experiment on the CGRO detected prompt γrays (during T_{90} of the keV/MeV emission) above 100 MeV in four bright bursts. The composite spectrum of the bursts is well fit by a power law with a hard differential index of 1.95 and no indication of a spectral break or cut off up to an energy of 10 GeV [3]. For GRB 940217, the high energy emission continued for 90 minutes after the start of the burst and included an 18-GeV photon about 80 minutes after the burst onset [4]. Not only is there no indication of a highenergy cutoff in the spectrum of this burst, but both the prompt and delayed high-energy spectra show some indication of hardening above about 1 GeV. In another case, a high energy emission component, with a duration of 211 s, compared to the 77 s T_{90} measured by

BATSE, was found extending up to at least 200 MeV in GRB 941017 [5]. This component is quite hard, with a differential power law index about 1 and with the peak of the E^2 dN/dE distribution above the 200 MeV limit of the instrument. A similar component has been identied in GRB 980923 [6]. The Fermi-LAT instrument recently detected high energy emission from GRB 080916C continuing for at least 1300 s after the burst trigger and extending above 1 GeV. The detection of a 13 GeV photon by the Fermi-LAT from GRB 080916C [7] at a redshift of 4.35 ± 0.15 [8] shows that photons with at least 70 GeV can be produced by GRBs. In addition, Swift-XRT detected a delayed rebrightening of the Xray afterglow in many bursts. This would suggest the possibility of correlated γ-ray emission originating from IC scattered photons [9] [10].

II. VERITAS OBSERVATIONS

VERITAS (the Very Energetic Radiation Imaging Telescope Array System) is an array of four 12 m aperture imaging atmospheric Cherenkov telescopes (IACT) [11], [12], operating at the Whipple Observatory in southern Arizona. By indirect detection of showers produced by γ-rays interacting in the atmosphere, VER- ITAS can achieve a very large effective area, e.g. 20000 m^2 at 300 GeV. The showers are reconstructed from the images of the Cherenkov light they produce, as recorded in the 3.5^∘ field of view cameras of at least two of the four telescopes. At zenith, the energy threshold for spectral reconstruction is about 150 GeV, and the energy resolution for individual gamma rays is 15- 20%. The 68% containment radius for reconstructed γray directions decreases with increasing energy, ranging from 0.1^∘ to 0.2^∘ . VERITAS can detect a γ-ray source with 5% of the Crab Nebula flux in 2.5 hours. GRB observations during the first three hours after a burst are preauthorized by the VERITAS Time Allocation Committee as the highest priority observations. The VERI- TAS control computers monitor a socket connection to the GCN^1. In the event of a GRB, an audible alarm sounds and a dialog box pops up guiding the operators to retarget the telescopes. The telescope slew speed of 1^∘ s^{−1} , independently in elevation and azimuth, is the limiting delay to the beginning of observations for most bursts.

VERITAS is operating with the full array system of four telescopes since September 2007. From that

1see http://gcn.gsfc.nasa.gov for the details

2 N. GALANTE, VERITAS OBSERVATION OF GRB

TABLE I: Observed GRBs during the period between January 2008 and April 2009 after the selection criteria explained in the text. The seven columns represent: the GRB name; the T_{90}; the total delay of observation from T_0, that includes the delay of the GCN alert, the reaction time of the operators and the slewing time; the observation time interval; the VERITAS energy threshold for the observation; the flux upper limit above the energy threshold; the redshift.

GRB T_{90} ΔT Time Interval E_{th} Upper Limit redshift [s] [s] UT [GeV] [cm^{−2} s^{−1}] GRB 080310 365 282 08:42:40 – 12:33:40 350 4.48 × 10^{−12} 2.43 GRB 080330 61 156 03:43:52 – 04:03:54 250 2.31 × 10^{−11} 1.51 GRB 080604 82 281 07:31:42 – 09:38:21 350 6.33 × 10^{−12} 1.42 GRB 080607 79 184 06:10:31 – 06:30:33 450 1.32 × 10^{−11} 3.04 GRB 081024A 1.8 150 05:55:38 – 09:07:49 250 6.81 × 10^{−12} –

date, data on the incoming GCN alerts with all four telescopes operating have been collected. Bursts with an uncertainty on the coordinates larger than 5^∘ have been excluded. In the period from September 2007 to April 2009, data on 15 GRBs have been recorded during dark night conditions (no moon). Data recorded under nonoptimal technical conditions have been omitted. Work is now underway to characterize the low elevation and moonlight performance of VERITAS, and results for these bursts should become available in the next future. In this paper, we present results for the 5 bursts having data at high elevation, above ∼ 45^∘.

III. DATA ANALYSIS The data have been analyzed using the VERITAS standard VEGAS analysis package, with background rejection cuts optimized on a Crab-like spectrum. The direction and impact point of each shower is reconstructed from the positions and orientations of the shower images in the cameras. Candidate γ-ray showers are required to have images with length and width consistent with expectations from simulated showers of the corresponding size and distance from each telescope, allowing a large fraction of the background proton showers to be rejected. Proton showers typically have longer and wider images.

Table I shows the result of the analysis performed on the five selected GRBs. For each of the 5 bursts, there is no signicant excess at the nominal position of the burst and the distribution of event excesses in the field of view is consistent with a Gaussian distribution expected from background fluctuations. Integral upper limits on the photon flux are calculated at the 99% condence level using the method described by [13] assuming a Poissonian background and a 20% uncertainty on the efficiency. All upper limits are calculated above the energy threshold of the data set recorded.

IV. CONCLUSIONS Between Winter 2008 and Spring 2009 VERITAS could react and follow up 13 GRB events, out of which only 5 fell into the requirements for a reliable standard analysis. Observations were performed with a typical delay of 1–4 minutes since the burst T_0. No positive detection has been recorded (as expected given the high redshift values of the bursts) and upper limits above the energy threshold have been obtained. Work to fully characterize the telescope array performances at large zenith angle and during moon time is in progress.

AKNOWLEDGMENTS

This research is supported by grants from the US Department of Energy, the US National Science Foundation, and the Smithsonian Institution, by NSERC in Canada, by Science Foundation Ireland, and by STFC in the UK. We acknowledge the excellent work of the technical support staff at the FLWO and the collaborating institutions in the construction and operation of the instrument.

REFERENCES

[1] J. Albert et al. 2006, ApJ, 641, L9 [2] J. Albert et al. 2007, ApJ, 667, 358 [3] B. L. Dingus 2001, AIPC, 558, 383 [4] K. Hurley et al. 1994, Nature, 372, 652 [5] M. M. Gonzalez et al. 2003, Nature, 424, 749 [6] M. M. Gonzalez 2004, Ph.D. Thesis, U. of Wisconsin, Madison [7] A. A. Abdo et al. 2009, Science, 323, 1688 [8] J. Greiner et al. 2009, A&A, 498, 89 [9] X. Y. Wang et al. 2006, ApJ, 641, L89 [10] X. Y. Wang et al. 2007, AIPC, 921, 271 [11] T. C. Weekes et al. 2002, ApP, 17, 221 [12] J. Holder et al. 2006, ApP, 25, 391 [13] Rolke, W. A. 2005, NIMPRA, 551, 493