arXiv:1110.1643v3 [gr-qc] 9 Jun 2012

Published in Gen Relativ Gravit (2012) 44: 1713-1723

DOI 10.1007/s10714-012-1361-4 http://www.springerlink.com/content/2q3081435g3568v1/

General relativistic Sagnac formula revised

Paolo Maraner · Jean-Pierre Zendri

Abstract The Sagnac effect is a time or phase shift observed between two beams of light traveling in opposite directions in a rotating interferometer. We show that the standard description of this effect within the framework of general relativity misses the effect of deflection of light due to rotational inertial forces. We derive the necessary modification and demonstrate it through a detailed analysis of the square Sagnac interferometer rotating about its symmetry axis in Minkowski space-time. The role of the time shift in a Sagnac interferometer in the synchronization procedure of remote clocks as well as its analogy with the Aharanov-Bohm effect are revised.

Keywords Sagnac effect · Relativistic corrections · Clocks synchronization · Aharanov-Bohm effect

1 Introduction

Consider a beam of monochromatic light split by a half-silvered mirror in two beams, and those two beams directed in a close path around a set of mirrors in opposite directions (see Fig. 1). Subsequently observe the interference pattern of the beams emerging out of the half-silvered mirror. If the apparatus is at rest with respect to a local reference frame of inertia, the beams will travel the same distance at the same speed, so they will arrive at the end point simultaneously. If the apparatus is set in rotation, they will no longer arrive simultaneously. The leading contribution to the arrival time shift Δt is given

Paolo Maraner School of Economics and Management, Free University of Bozen-Bolzano, via Sernesi 1, 39100 Bolzano, Italy E-mail: pmaraner@unibz.it

Jean-Pierre Zendri INFN sezione di Padova, via Marzolo 8, 35131 Padova, Italy E-mail: Jean-Pierre.Zendri@lnl.infn.it

Fig. 1 A square Sagnac interferometer rotating about its symmetry axis in an inertial frame of reference. by cΔt ≈ 4 c A · ω, (1) with A the vector area embraced by the interferometer, ω the angular speed of rotation and c the speed of light. This was predicted and observed by Sagnac in 1913 [1,2,3,4].^1 The interpretation of the Sagnac effect, as well as the computation of relativistic corrections to (1), have been the subject of endless controversies since.^2 Nonetheless, compasses of inertia based on this effect are today capable of detecting rotation rates as small as 10^{−12} radiant per second [15]. Its applications are in commercial navigation systems, in Earth rotation monitoring [15,16] and might soon provide a direct Earth-bound measure of Lense-Thirring frame dragging [17,18,19]. Admittedly relativistic corrections to (1) are too small to be of practical interest in present applications. Their correct evaluation is important in planing future experiments and from the theoretical point of view however. On the theoretical side the effect is involved in the synchronization procedure of remote clocks [20,21], provides a gravitational analogue of the Aharonov-Bohm effect [22,23,24,25,26] and a general characterization of rotations in general relativity [22]. Up to now its description within the framework of general relativity is given as follows: in a stationary space-time with coordinates x = (ct, x) and line element ds^2 = g_{μν} (x)dx^μdx^ν , the coordinate-time shift Δt is given by the formula cΔt = −2 ∮ C g_{0i} g_{00} dx^i, (2) 1 An analogous effect is predicted [5,6,7] and observed [8,9,10,11] for matter beams. In this paper we focus on the optical Sagnac effect. Analogies and differences with the Sagnac effect for matter beams are discussed in section 4.

2 Leaving aside claims that the Sagnac effect entails a conflict with the principles of relativity, it remains the fact that there is still no full agreement on its explanation in a general context. Corrections to the Sagnac formula beyond those linear in ω are still to be univocally determined. See e.g. the remarks on p. 145 of [10], and subsection 2.3 of [12]. See also [13] and [14].

with C the closed path traveled by light in the interferometer;^3 the proper-time shift Δτ, which is the quantity directly related to the phase shift measured at the detector, is then obtained as Δτ = √ |g_{00}(x_{det.})|Δt, (3) with g_{00}(x_{det.}) the 00 metric entry evaluated at detector’s position. To the leading order (3) reproduces (1), plus relativistic corrections. The proof of (2) essentially parallels the computation of the coordinate-time delay in the synchronization procedure of a clock transported along a closed path.^4 More sophisticated, but substantially equivalent proofs are given in [22,24]. In this paper we would like to point out that equation (2) only provides the correct leading order to the time delay in a Saganc interferometer, while it is not suitable for the computation of relativistic corrections. This is because of the implicit assumption that the two beams propagating in opposite directions in a rotating Sagnac interferometer follow an identical path. Nevertheless, in a rotating frame of reference, null geodesics connecting different space-time points in opposite directions are in general not coincident (see Fig. 2).^5 This implies the inadequacy of (2) in computing relativistic corrections and the need for its revision. In order to obtain an appropriate general relativistic Sagnac formula, we go over the derivation of (2) and introduce the necessary changes. The outcome is considerably less elegant than (2) and no longer describes the time delay in a Sagnac interferometer as the circulation of a vector field. It nevertheless provides the right mean of performing the computation. To demonstrate this in a specific case, we focus on the square Sagnac interferometer rotating about its axis in Minkowski space-time. We compute the exact time shift in an inertial frame of reference and show disagreement with the prediction of (2) and agreement with the prediction of the revised formula. In order to estimate relativistic corrections in a realistic case, we then consider the square interferometer rotating around a point different from its center. Finally, we discuss some implications of the revised formula.

2 Derivation of Sagnac formula

Parameterizing the null geodesic followed by either the clockwise or counterclockwise beam as γ(z) = (ct(z), x(z)) with z ∈ [0, z̄], we have that

c^2g_{00} ( dt dz )_2 + 2cg_{0i} dx^i dz dt dz + g_{ij} dx^i dz dx^j dz = 0.

3 The interferometer is at rest in the given coordinates frame. Metric entries do not depend on the time-coordinate t. Greek indices μ, ν, ... range form 0 to 3 while Latin ones i, j, ... from 1 to 3. Our signature convention is −, +, +, +.

4 The standard reference is [27], where the formula is obtained in relation to the synchronization of clocks transported along closed paths, without mention to the Sagnac effect. With explicit mention to the Sagnac effect, the formula is re-derived with different notations and/or particular assumptions in a number of papers. For a recent re-derivation see e.g. [14].

5 This effect is automatically taken into account in the general formalism describing the split and propagation of light in relativity, developed by S. L. Bażański [28].

The metric entries g_{00}, g_{0i} and g_{ij} are evaluated along the null geodesic γ(z) or equivalently, given the coordinate-time independence of the metric, along the spatial path C(z) = (0, x(z)) followed by the beam in the interferometer. The solutions of the above quadratic equation read c ( dt dz ) ± = − g_{0i} g_{00} dx^i dz ± √ γ_{ij} |g_{00}| dx^i dz dx^j dz , where γ_{ij} = g_{ij} − g_{0i}g_{0j} /g_{00} is the three-dimensional positive definite spatial metric induced by the space-time metric [27]. As usual, we identify the positive solution (dt/dz)_+ with the counterclockwise beam and the negative solution (dt/dz)_− with the clockwise beam. At this point, however, we have to distinguish between the spatial path C_⟲(z) followed by the counterclockwise beam and the spatial path C_⟳(z) followed by the clockwise one. The total coordinate-time t_⟲ traveled by the counterclockwise beam is then given by ct_⟲ = c ∫_{z̄} 0 ( dt dz ) + dz = − ∮ C_⟲ ( g_{0i} g_{00} dx^i − 1 √ |g_{00}| dl ) , where dl = √ γ_{ij} dx^idx^j is the induced spatial line element. The total coordinatetime t_⟳ traveled by the clockwise beam reads instead ct_⟳ = c ∫_0 z̄ ( dt dz ) − dz = −c ∫_{z̄} 0 ( dt dz ) − dz = ∮ C_⟳ ( g_{0i} g_{00} dx^i + 1 √ |g_{00}| dl ) , with analogous notations. Correspondingly, the coordinate-time shift Δt = t_⟲ − t_⟳ is obtained as cΔt = − ∮ C_⟲ g_{0i} g_{00} dx^i − ∮ C_⟳ g_{0i} g_{00} dx^i + ∮ C_⟲ 1 √ |g_{00}| dl − ∮ C_⟳ 1 √ |g_{00}| dl. (4) Given the differences in the integration paths, the first two integrals no longer sum up as in (2) and the third and fourth ones no longer cancel. The proper time shift Δτ measured at the detector is again obtained by multiplying Δt by √ |g_{00}(x_{det.})| as in (3).

3 Square Sagnac interferometer

In order to demonstrate in a specific case the need for the revision of (2), we proceed by computing the time shift for the square Sagnac interferometer displayed in figures 1 and 2, rotating about its symmetry axis with angular speed ω in Minkowski space-time. This allows us to perform the computation in two distinct and independent ways. First, in an inertial frame of reference where the interferometer is rotating. This approach does not employ the formalism of general relativity and provides us with the exact result to an arbitrary accuracy. Then, we evaluate the same time shift in a non-inertial frame of reference

Fig. 2 A square Sagnac interferometer at rest in a non-inertial frame of reference rotating about the symmetry axis of the interferometer. The natural rotation parameter ωr̄/c is set to about 0.3.

where the interferometer is at rest by means of (2) and (4). The comparison with the exact result shows disagreement with the prediction of (2) and agreement with the one of (4), also displaying the order of magnitude of the various contributions.

Inertial frame of reference. In Figure 1 consider a light pulse emitted at t = 0 from the half-silvered mirror toward the upper mirror. In a reference frame centered in the interferometer, with left-right oriented horizontal x-axis and bottom-up oriented vertical y-axis, we can take the upper mirror to move according to x(t) = ∓r̄ sin ωt, y(t) = r̄ cos ωt, where r̄ is the radius of the interferometer and ∓ refer to counterclockwise, resp. clockwise, rotation. Correspondingly the light pulse propagates according to x(t) = r̄ + ct cos α, y(t) = ct sin α, (5)

with c the speed of light and α the angle of emission measured in counterclockwise versus with respect to the positive direction of the x-axis. After introducing the dimensionless quantities z = ct r̄ and ϵ = ωr̄ c , the match conditions at time t̄ conveniently write as { z̄ cos α = −(1 ± sin ϵz̄) z̄ sin α = cos ϵz̄ , (6)

with z̄ = ct̄/r̄. Squaring both equations and adding term by term, we have

z̄^2 = 2 (1 ± sin ϵz̄) . (7)

This can be solved by a series expansion in the natural parameter ϵ. After rescaling, we obtain the times t̄_⟲ and t̄_⟳ needed for a light pulse to travel from one mirror to the next in the counterclockwise, resp. clockwise, direction as t̄_{⟲,⟳} = r̄ c ( √ 2 ± ϵ + √ 2 4 ϵ^2 ∓ 1 3 ϵ^3 − 17 √ 2 32 ϵ^4 + ... ) . (8)

For later use we also evaluate the emission angles α_⟲ and α_⟳ for the counterclockwise, resp. clockwise, beam, by substituting t̄_⟲, resp. t̄_⟳, back in to (6) α_{⟲,⟳} = 3 4 π ± √ 2 2 ϵ + 1 2 ϵ^2 ± √ 2 8 ϵ^3 − 1 6 ϵ^4 + ... . (9)

Finally, we obtain the coordinate-time delay Δt for the square interferometer multiplying by four the difference t̄_⟲ − t̄_⟳ cΔt = 8r̄^2ω c [ 1 − 1 3 (ωr̄ c )_2 − 19 30 (ωr̄ c )_4 + ... ] . (10)

The corresponding proper-time delay is obtained by further multiplying Δt by the relativistic factor √ 1 − v^2_{det.}/c^2, with v_{det.} ≡ ωr_{det.} the constant speed of the detector and r_{det.} its radial position. By assuming r_{det.} ≃ r̄ we obtain cΔτ = 8r̄^2ω c [ 1 − 5 6 ( ωr̄ c )2 − 71 120 (ωr̄ c )4 + ... ] . (11)

The leading term is the original Sagnac term, given by four times the area enclosed by the light path, times the angular speed ω, divided by the squared speed of light. The remaining terms are tiny corrections, relevant from a theoretical point of view but hardly detectable experimentally. As a concrete example, let us imagine to place the large ring laser G in Wettzell on a turntable. This interferometer has now reached a theoretical sensitivity Δω ≃ 10^{−12}rad/s and r̄ ≃ 3m [15]. Setting G in rotation at the realistic angular speed of ω ≃ 1rad/s one obtains a relative sensitivity Δω/ω ≃ 10^{−12}. This is some four order of magnitude below the relative sensitivity Δω/ω =^5_6 (_{ωr̄} c )_2 ≃ 10^{−16}, needed for the detection of relativistic corrections. Relativistic effects become visible at an angular speed ω ≃ 30rad/s.

Non-inertial frame of reference. We now repeat the computation in the framework of general relativity first by means of (2) and then by means of (4). We start by transforming to a rotating frame of reference where the interferometer is at rest [29] t → t, r → r, ϕ → ϕ − ωt. (12) In the new coordinates the line element reads

ds^2 = − ( 1 − ω^2r^2 c^2 ) c^2dt^2 + dr^2 + r^2dϕ^2 + 2ωr^2dtdϕ,

whence the metric entries g_{tt}, g_{rr}, g_{ϕϕ} and g_{tϕ}. We then apply the formulas

(2): In order to apply (2), we parameterize the Euclidean straight segment connecting the half-silvered mirror with the upper mirror as r(w) = r̄ √ 1 + w^2 1 + w

, ϕ(w) = arctan (w) ,

with w ∈ [0, +∞). Substitution in g_{tϕ}/g_{tt} · dϕ/dw, expansion in ϵ, integration in dw form 0 to +∞ and multiplication by 4, leads to the coordinatetime shift cΔt = −2 ∮ C g_{tϕ} g_{tt} dϕ = 8r̄^2ω c [ 1 + 2 3 ( ωr̄ c )2 + 7 15 ( ωr̄ c )4 + ... ] . (13)

As expected, the expansion fails to reproduce (10) already at the next-to-leading order because light pulses do not propagate along straight segments in the co-moving frame of reference.

(4): In order to apply (4), we compute the paths effectively followed by the counterclockwise and clockwise beams (see Fig. 2) by solving the corresponding geodesics equations or, equivalently, by transforming (5) to rotating coordinates by means of (12). We obtain r(z) = r̄ √ 1 + 2z cos α + z^2, ϕ(z) = arctan ( z sin α 1 + z cos α ) ∓ ϵz, with z ∈ [0, z̄], ∓ again referring to the counterclockwise, resp. clockwise beam, and α, z̄ resp. equal to α_⟲,^c_{r̄} t̄_⟲ or α_⟳,^c_{r̄} t̄_⟳. As above, substitution in g_{tϕ}/g_{tt} · dϕ/dz, expansion in ϵ, integration in dz form 0 to z̄ and multiplication by four allows to compute the first two integrals appearing in (4) as − ∮ C_⟲ g_{tϕ} g_{tt} dϕ− ∮ C_⟳ g_{tϕ} g_{tt} dϕ = 8r̄^2ω c [ 1 − 1 3 (ωr̄ c )2 − 11 30 (ωr̄ c )4 + ... ] . (14)

Analogously, by substituting in √_{γrr} |g_{tt} | d^2r dz^2 + γ_{ϕϕ} |g_{tt} | d^2ϕ dz^2 , expanding in ϵ, etc.,

we evaluate the third and fourth integrals as ∮ C_⟲ 1 √ |g_{tt}| dl − ∮ C_⟳ 1 √ |g_{tt}| dl = 8r̄^2ω c [ − 4 15 ( ωr̄ c )_4 + ... ] . (15)

The first two terms of (10) correspond to the leading and next-to-leading order terms of (14), while higher order terms are correctly reproduced only when (15) is added. In accordance with the revised formula (4), the sum of (14) plus (15) predicts the correct coordinate-time shift (10) and consequently the correct proper-time shift (11) for the rotating square interferometer. This is due to the different paths followed by the counter propagating beams being correctly taken into account.

In order to estimate relativistic corrections in a more realistic situation, we consider a square interferometer rotating with angular speed ω around a point different from its center. This might be an interferometer located on Earth’s surface on the plane parallel to the equatorial plane. It should be noted, that due to the lack of symmetry there is no longer guarantee that the paths followed by the two counter propagating rays coincide at each mirror. Correspondingly, the two Sagnac loops no longer exactly close as in figures 1 and 2. This possible source of error can be avoided by replacing the Sagnac interferometer with a Mach-Zehnder interferometer. The two components of the original beam follow then independent equal length paths that can be separately tuned (see Fig. 3). The time delay is half of the one measured in a Sagnac interferometer. Its analytical value is again given by (4), divided by two. The first two integrals combine now in the synchronization gap ∮ g_{0i}/g_{00}dx^i, computed along the union of the two paths effectively followed by light beams. The third and fourth integral still provide a small but non-vanishing contribution extraneous to the synchronization gap. By proceeding as above, we obtain the coordinate-time delay cΔt = 4r̄^2ω c [ 1 + ( R^2 r̄^2 − 1 3 ) ( ωr̄ c )2 + ... ] , (16)

with R the distance of the interferometer form the center of rotation and √ 2r̄ its side. Assuming r_{det.} ≃ R the corresponding proper-time delay is then given by cΔτ = 4r̄^2ω c [ 1 + ( R^2 2r̄^2 − 1 3 ) ( ωr̄ c )_2 + ... ] . (17)

Whereas the leading Sagnac time delay does not depend on the position of the center of rotation, relativistic corrections do. On the one side this has the effect of amplifying the order of the first correction from (ωr̄/c)^2 to the generally much larger (ωR/c)^2. For Earth’s rotation R ≃ 6.4 × 10^4m and ω ≃ 0.7 × 10^{−4}rad/s. The detection of relativistic corrections requires therefore a relative sensitivity Δω/ω =^1_2 (_{ωR} c )_2 ≃ 1.1 × 10^{−12}. Still four order of magnitude from the relative sensitivity of 10^{−8} of the large ring laser G in Wettzell [15], but just one order of magnitude from the promised value of 10^{−11} of the multiring-laser gyroscope designed for the measurement of the Lense-Thirring drag at 1% [19]. On the other side, the dependence on R opens to the theoretical possibility of a direct measure of the radius of rotation. This would allow the realization of an absolute (non barometric) altimeter, a tool of extraordinary importance in navigation systems and geophysical applications.

4 Discussion

We have shown that the correct treatment of deflection of light due to rotational inertial forces, requires a slight revision of the general relativistic Sagnac formula. The corrections involved are too small —second and higher order in

Fig. 3 A square Mach-Zehnder interferometer rotating around a point different from its center. In presence of rotation the two counter-propagating beams can be re-directed to the detector by adjusting the orientation of the two mirrors.

the rotation parameter— to be of practical interest in present applications. However, their correct evaluation is important from a theoretical point of view. In this respect a few observations are in order.

In discussing relativistic corrections to the Sagnac formula (1) most authors consider the propagation of light along a given curved path. In general a circular path. The underlying idea is that any curved path can be approximated with arbitrary accuracy by a polygonal path, realized for example by an optical fiber. While this limiting procedure makes perfect sense in mathematics, it necessarily stops at wavelength scales in the physical reality. Moreover, the wave propagation in a curved wave-guide is only effectively free. Extrinsic curvature, torsion and other constraint corrections [30] are in general much larger than the tiny relativistic corrections. As a consequence equation (2) is not suitable for the computation of relativistic corrections to the leading Sagnac term, neither for loop interferometers, as proven in this paper, nor for fiberoptic gyroscopes. Correspondingly the time delay in a Sagnac interferometer does not exactly correspond to the delay accumulated by a clock transported along an arbitrary closed path described by (2) [20,21]. The crucial difference is that in the latter case light signals are assumed to travel back and forth infinitesimally closed points: one first takes the difference between (dt/dz)_+ and (dt/dz)_− and then integrates over the path. In the Sagnac effect instead, light travels a finite path: one first integrates (over different paths) and then takes the difference of the results.

Next, we would like to comment on the analogy between the Sagnac effect in general relativity and the Aharanov-Bohm effect in quantum mechanics [22, 23,24,25,26]. As it is well known [31,25], the Sagnac effect as described by (2) is not a fully topological effect as the Aharanov-Bohm effect. This because the Coriolis-force field associated to the vector potential A_i = g_{0i}/g_{00} is in general non-vanishing. Nonetheless, the way the circulation of the vector potential affects the wave phase in the two effects is identical. However, our analysis shows that ∮ A_idx^i only describes the leading contribution to the time shift in a Saganc interferometer. The exact expression no longer writes as the circulation of a vector field. The contribution of the third and fourth integrals in (4) is in general very small, but not vanishing. Correspondingly, the analogy between the Aharanov-Bohm effect and the phase shift in a Sagnac interferometer is broken by relativistic corrections.

Finally, we remark that the considerations presented in this paper regarding the optical Sagnac effect, equally apply to the Sagnac effect for matter beams propagating with a subluminal speed v [5,6,7,8,9,10,11]. As for light beams, geodesics followed by matter particles traveling in opposite directions in a rotating frame are different. This effect needs to be taken into account in equal footing. Moreover, since the difference between clockwise and counterclockwise propagating paths increases by decreasing the particles speed, one should expect larger corrections. On dimensional grounds, besides terms proportional to ω^3/c^4 (see Eq. (17)), one should expect extra terms going as ω^3/v^2c^2 and ω^3/v^4. Preliminary computations confirm this expectation. These terms are larger than the corrections for light beams. For sufficiently slow particles they might become comparable and even larger than the classical Sagnac time shift.

Acknowledgements We wold like to thank J. K. Pachos for carefully reading the manuscript and related comments.

References

1. Sagnac G.: L’éther lumineux démontré par l’effet du vent relatif d’éther dans un interféromètre en rotation uniforme, C. R. Acad. Sci. 157, 708 (1913); Sur la preuve de la réalité de l’éther lumineux par l’expérience de l’interférographe tourant, C. R. Acad. Sci. 157, 1410 (1913) 2. Post E. J.: Sagnac Effect, Rev. Mod. Phys. 39, 475 (1967) 3. Chow W. W., Gea-Banacloche J., Pedrotti L. M., Sanders V. E., Schleich W., Scully M.

O.: The ring laser gyro, Rev. Mod. Phys. 57, 61 (1985) 4. Anderson R., Bilger H. R., Stedman G. E.: “Sagnac” effect: A century of Earth-rotated interferometers, Am. J. Phys. 62, 975 (1994) 5. Page L. A.: Effect of Earth’s rotation in neutron interferometry, Phys. Rev. Lett. 35, 543 (1975) 6. Anandan J.: Gravitational and rotational effects in quantum interference, Phys. Rev. D 15, 1448 (1977) 7. Dresden M., Yang C. N.: Phase shift in a rotating neutron or optical interferometer, Rev. Phys. D39, 1846 (1979) 8. Werner S. A., Staudenmann J.-L., Colella R.: Optical Ramsey spectroscopy in a rotating frame: Sagnac effect in a matter-wave interferometer, Phys. Rev. Lett 42, 1103 (1979) 9. Riehle F., Kisters Th., Witte A., Helmcke J., Bordé Ch. J.: Effect of Earth’s rotation on the quantum mechanical phase of the neutron, Phys. Rev. Lett 67, 177 (1991) 10. Hasselbach F., Nicklaus M.: Sagnac experiment with electrons: Observation of the rotational phase shift of electron waves in vacuum, Phys. Rev. A 48, 143 (1993) 11. Stockton J. K., Takase K., Kasevich M. A.: Absolute geodetic rotation measurement using atom interferometry, Phys. Rev. Lett 107, 133001 (2011) 12. Stedman G. E.: Ring laser tests of fundamental physics and geophysics, Rep. Prog. Phys.

60, 615 (1997) 13. Malykin G. B.: The Sagnac effect: correct and incorrect explainations, Phys. Usp. 43, 1229 (2000) 14. Kajari E., Buser M., Feiler C., Schleich W.P.: Rotation in relativity and the propagation of light, Rivista del Nuovo Cimento 32, 339 (2009)

15. Schreiber K. U., Klugel T., Wells J.-P. R., Hurst R. B., Gebauer A.: How to detect the chandler and the annual wobble of the Earth with a large ring laser gyroscope, Phys. Rev. Lett. 107, 173904 (2011) 16. Schreiber K. U., Klügel T., Velikoseltsev A., Schlüter W., Stedman G. E., Wells J-P.

R.: The large ring laser G for continuous Earth rotation monitoring, Pure and Applied Geophysics 166, 1485 (2009) 17. Stedman E., Schreiber K. U., Bilger H. R.: On the detectability of the Lense-Thirring field from rotating laboratory masses using ring laser gyroscope interferometers, Class. Quant. Grav. 20, 2527 (2003) 18. Di Virgilio A., Schreiber K.U., Gebauer A., Wells J-P.R., Tartaglia A., Belfi J., Beverini N., Ortolan A.: A Laser gyroscope system to detect the Gravito-Magnetic effect on Earth, Int. J. Mod. Phys. D 19, 2331 (2010) 19. Bosi F. et al.: Measuring gravito-magnetic effects by multi ring-laser gyroscope, Phys.

Rev. D 84, 122002 (2011) 20. Anderson R., Vetharaniam I., Stedman G.E.: Conventionality of synchronisation, gauge dependence and test theories of relativity, Phys. Rep. 295, 93 (1998) 21. Minguzzi E.: The Gauge nature of simultaneity, Class. Quant. Grav. 20, 2443 (2003) 22. Ashtekar A., Magnon A.: The Sagnac effect in general relativity, J. Math. Phys. 16, 341 (1975) 23. Sakurai J. J.: Comments on quantum-mechanical interference due to the Earth’s rotation, Phys. Rev. D 21, 2993 (1980) 24. Anandan J.: Sagnac effect in relativistic and nonrelativistic physics, Phys. Rev. D 24, 338 (1981) 25. Hendriks B. H. W., Nienhuis G.: Sagnac effect as viewed by a co-rotating observer, Quantum Opt. 2, 13 (1990) 26. Rizzi G., Ruggiero M. L.: The Sagnac phase shift suggested by the Aharonov-Bohm effect for relativistic matter beams, Gen. Rel. Grav. 35, 1745 (2003) 27. Landau L. D., Lifshitz E. M.: Classical theory of fields, Addison-Wesley, Massachussets (1996) 28. Bażański S.L.: The split and propagation of light rays in relativity, in On Einstein’s path, edited by A. Harvey, Springer, New York (1999); Some properties of light propagation in relativity, in Particels, fields and gravitation, edited by J. Rembielinski, AIP Conf. Proc. 453, 421 (1998) 29. Rindler W.: Relativity: Special, General, and Cosmological, Oxford University Press, Oxford (2009) 30. Burton D. A., Noble A., Tucker R. W., Wiltshire D. L.: Twisted electromagnetic modes and Sagnac ring lasers, Class. Quant. Grav. 22, 909 (2005) 31. Anandan J. , in Quantum Coherence, Proceedings of the International Conference on Fundamental Aspects of Quantum Coherence, edited by J.Anandan, University of South Carolina, Columbia, (1989)