arXiv:1111.1130v2 [astro-ph.SR] 13 Nov 2011

Modelling stellar convection and pulsation in multidimensions using the ANTARES code

Eva Mundprecht and Herbert J. Muthsam

Abstract The ANTARES code has been designed for simulation of astrophysical flows in a variety of situations, in particular in the context of stellar physics. Here, we describe extensions as necessary to model the interaction of pulsation and convection in classical pulsating stars. These extensions encomprise the introduction of a spherical grid, moveable in the radial direction, specific forms of grid-refinement and considerations regarding radiative transfer. We then present the basic parameters of the cepheid we study more closely. For that star we provide a short discussion of patterns of the H + HeI and the HeII convection zones and the interaction with pulsation seen in the pdV work or atmospheric structures.

1 Introduction

Time-dependent, non-linear models of the classical pulsating variables (cepheids, RR Lyr) are around since decades. Nearly all those models have treated the issue in one spatial dimension (plus time). As is well known, for the stars near the red edge the inclusion of convection is mandatory. Given the basic 1D computational setting, this had to be done using simplyfied models for convection. For a detailed discussion of shortcomings of this approach and their consequences see [1],[2].

We therefore have adapted the ANTARES code, [5], in order to comply with the needs for modelling such stars in multidimensions (2D presently). In section 2 we address a few technical issues, in section 3 we discuss a specific model.

Eva Mundprecht Faculty of Mathematics, University of Vienna, e-mail: eva.mundprecht@univie.ac.at

Herbert J. Muthsam Faculty of Mathematics, University of Vienna, e-mail: herbert.muthsam@univie.ac.at

1

2 Technical Issues

The simulations were performed on a stretched, polar and moving grid. We discuss the radiative transfer equation (RTE) and restrictions on time stepping in turn.

The Radiative Transfer Equation. Near the surface, nontrivial energy exchange between gas and radiation is included via the RTE with grey opacities, while diffusion approximation is used for the deeper layers. The RTE in 1D is solved along single rays via the short characteristics method of Kunasz and Auer [4]. In 2D either 12 or 24 ray directions are chosen according to the angular quadrature formulae of type A4 or A6 of Carlson [3], and the directions in each quadrant are arranged in a triangular pattern. For each ray the points of entrance and exit plus the corresponding distances are determined. Since the grid moves this has to be redone every step. The RTE μ ∂ I ∂ τ = S − I (1)

is then solved along each ray. This procedure is repeated recursively since after the first step one gets just the intensity on a single new point.

Time Stepping. The time step for our (explicit) method is never limited by the classical CFL condition but is due to radiation transport. Using the diffusion approximation also near the surface would enforce prohibitively small time steps,

Δt_{di f f usive} ∝ min ( 3 c_p 16κσT^3 ( κρ k )_2) ∼ min ( min(Δr_i,Δy_i)^2 χ ) . (2)

Fortunately, the radiative transfer equation allows the time step to stay in contact to the time scale for relaxing a temperature perturbation on the scale of the grid size by radiation (Spiegel’s relation, [6]),

Δt_{rad} ∝ min ( c_p 16κσT^3 ( 1 − κρ k arccot κρ k )_{−1}) , (3)

with k =^{2π}_{min(Δri,Δyi)} , which in practice leads to larger time steps.

3 Results

3.1 Model settings

The parameters of our cepheid are T_{e f f} = 5125 K, logg = 1.97, L = 913 L_⊙ and M = 5 M_⊙. The period is about 4 days, the radius is 26 Gm, of which the outer 11.3 Gm were modelled. The opening angle used here is either 1^∘ or 10^∘. For the 10^∘ model the computational area has 510 radial grid points and 800 lateral points. For the 1^∘ model these number are 800 and 300, respectively. Radially the grid

Stellar convection and pulsation 3

is stretched from cell to cell by a factor of 1.011 and 1.07, respectively. The radial mesh sizes of the 10^∘ model vary from 0.47 Mm at the top to 124 Mm at the bottom. The runs with these opening angles were started from one and the same 1D model which had been relaxed for more than 100 periods. – The 10^∘ model is wide enough to harbour convection cells of the HeII convection zone. Its resolution is insufficient to reasonably represent the H + HeI convection zones. This purpose is achieved by the 1^∘ model. – We discuss now the HeII and the H + HeI convection zone in turn.

3.2 The HeII convection zone

After some time granted to the HeII c.z. for proper development, ten useful periods for evaluation are at our disposal. Visualization shows a clear dependence of convection on phase. Near maximum compression the lower part of descending plumes tends to detach from the body of the c.z., and upon expansion the body reorganizes, gains strength and new plumes appear.

Figure 1 shows phase dependence for the pdV work of the HeII zone, averaged over the ten useful periods. pdV refers to the work done by convection only, without pulsational contribution. Besides the varying strength of the work we see also some contributions due to plumes plunging into the stable region below.

These plumes also generate noticeable gravity waves, discernible down to our lower boundary. Laterally, their extent coincides with the width of our computational domain. An even wider sector may be appropriate. They have not yet reached their statistically steady state, keeping growing.

With such models, it is also possible to test and calibrate among others convection models routinely used in modelling of radially pulsating stars.

Fig. 1 pdV work due to convection, averaged over ten periods as a function of pulsational phase. Below the convection zone proper, overshooting plumes also contribute to some extent.

3.3 The H + HeI convection zone

With the 1^∘ model the H + HeI is reasonably resolved and, as a result, much more vigorous than in the 10^∘ case. Velocities (pulsation subtracted) easily get supersonic. Note the network of shocks above the hydrogen ionization front in figure 2.

Fig. 2 Upper convection zone upon contraction. Top is to the left. Colours: density of gas. Isolines mark the indicated ionization degrees of hydrogen and helium.

Frequently, shocks move upwards. In one case, this leads to the strong highdensity region quite at the top. Here, our closed boundary conditions failed. We are working on implementing open boundary conditions at the top. – Mass loss in cepheids is a topic of present discussion. Results as the present one hint at the intriguing possibility that convectively induced shocks may be a cause. – Generally, it should be noted that such calculations are very expensive even in 2D and by no means all cepheids are within computational reach.

Acknowledgements Support by the Austrian Science Foundation, project P20973, is gratefully acknowledged.

References

1. Buchler, J. R. 1997, Variables Stars and the Astrophysical Returns of the Microlensing Surveys, 181 2. Buchler, J. R. 2009, American Institute of Physics Conference Series, 1170, 51 3. Carlson, B.G., 1963, in Alder, B., Fernbach, S. (eds) Methods in Computational Physics, 1 4. Kunasz, P. and Auer, L. H., 1988, Short characteristic integration of radiative transfer problems: Formal solution in two-dimensional slabs, JQSRT 39, 67 5. Muthsam, H. J., Kupka, F., Löw-Baselli, B., et al. 2010, NewAst, 15, 460 6. Spiegel, E. A., 1957, The Smoothing of Temperature Fluctuations by Radiative Transfer, ApJ 126