arXiv:astro-ph/0101176 v2 14 Jan 2001

WIMP SEARCHES WITH SUPERHEATED DROPLET DETECTORS: STATUS AND PROSPECTS

J.I. COLLARx, D. LIMAGNE, T. MORLAT, J. PUIBASSET, G. WAYSAND Groupe de Physique des Solides (UMR CNRS 75-88), Universités Paris 7 & 6, 75251 Paris Cedex 05, France

T.A. GIRARD xCentro de Física Nuclear, Universidade de Lisboa, 1649-003 Lisbon,Portugal

H.S. MILEY Pacific Northwest National Laboratory, Richland, WA 99352, USA

SIMPLE (Superheated Instrument for Massive ParticLE searches) employs superheated droplet detectors (SDDs) to search for Weakly Interacting Massive Particle (WIMP) dark matter. As a result of the intrinsic SDD insensitivity to minimum ionizing particles and high fluorine content of target liquids, competitive WIMP limits were already obtained at the early prototype stage. We comment here on the expected immediate increase in sensitivity of the program and on future plans to exploit this promising technnique.

1 Introduction

Superheated Droplet Detectors (a.k.a. SDDs or Bubble Detectors) consist of a dispersion of small drops (radius ¸ 10 μm) of superheated liquid in a gel or viscoelastic matrix, with a droplet filling factor of few %. This relatively recent development in radiation detection technology^1 combines the wellknown characteristics of bubble chambers with several advantageous features: the SDD matrix isolates the fragile metastable system from vibrations and specially from convection currents (damped in gels), while the smooth liquidliquid interfaces impede the continuous triggering on surface impurities that occurs even in “clean” bubble chambers. In this way, the extended lifetime of the superheated state allows for new practical applications such as personnel and area neutron dosimetry. In the moderately superheated industrial refrigerants used in SDDs, bubbles can be produced only by particles having elevated stopping powers, as is the case for low-energy nuclear recoils. This behavior is described by the “thermal spike” model^2: for the transition to occur, a vapor nucleus or “protobubble” of radius > r_c (¸tens of nm) must be created, while only the energy deposited along a distance comparable to this critical radius r_c is available for its formation. Hence, a double threshold is imposed: the requirement that the deposited energy E be larger than the thermodynamical work of formation of the critical nucleus, E_c, and that this energy be lost by the particle over a distance O(r_c), i.e., a minimum stopping power. Protobubbles formed by energy depositions not meeting both demands shrink back to zero; otherwise, the whole droplet vaporizes producing a characteristic sound^a used for detection purposes. Both thresholds depend on operating conditions^{4,5}: keV nuclear recoils are detectable at room temperature and atmospheric pressure, allowing for a low-cost WIMP search free of the complications associated to cryogenics. Most importantly, the minimum dE/dx requirement provides a total insensitivity to most backgrounds interfering with WIMP searches, internal α-emitters being the only concern^3.

2 Detector Fabrication

SDDs of active mass O(1) kg can considerably extend the present experimental sensitivity to WIMPs well into the region where new supersymmetric particles are expected^3. The modest active mass of commercially available SDDs (¸ 0.03 g refrigerant/dosimeter), together with a desire to control and understand the fabrication process, lead us to develop a large-volume pressure reactor dedicated to SDD production. Three years of R&D were necessary to produce SDD modules simultaneously meeting all requirements of alphaemitter radiopurity, stability and large-mass (presently ¸ 1000 times that of commercial SDDs) necessary for this new application. Details on the fabrication process, purification and testing can be found in^{4,5}. The emphasis of the program has been on keeping the number of detector components down to a minimum for reasons of radiopurity, safety and cost, imposing the need to solve multiple condensed-matter issues with as few elements as possible. The target mass of present SIMPLE modules is limited only by the dimensions of the pressure reactor. They can be operated continuously for up to ¸ 40 d, while polyacrylamide gel-based commercial bubble dosimeters are intended for just a few hours of continuous exposure. The construction of recompression chambers that will allow for an indefinite exposure is underway. The material cost of the SDDs is very low, permitting a much larger future design.

3 Calibrations

The response of smaller SDDs to various neutron fields has been extensively studied^{6,7,8} and found to closely match theoretical expectations. However,

aThis sharp, high-pitched sound is similar to that produced by spraying water on hot oil, the physical mechanism (vaporization of superheated water) being the same.

large-size, opaque SDDs require independent calibration: acoustic detection of the explosion of the smallest droplets or of those most distant from the piezolelectric acoustic sensors is not a priori guaranteed. Two separate types of calibration have been performed to determine the target mass effectively monitored in SIMPLE modules and to check the calculation of the temperatureand pressure-dependent threshold energy E_{thr} above which WIMP recoils can induce nucleations^{3,9}. SIMPLE SDD modules have been exposed to a wellcharacterized^{252}Cf neutron source at the TIS/RP calibration facility (CERN) 4,5. A satisfactory agreement between the observed nucleation rate and Monte Carlo simulations was found at different pressures and temperatures^{4,5}. As a result of this calibration, the sound detection efficiency with present sensors was found to be 34 � 2% (74 � 4%) at P =2 atm (P =1 atm), a decisive piece of information to obtain dark matter limits. A second type of calibration can be performed by homogeneously diluting a liquid^{241}Am source (an alpha-emitter) into the matrix prior to gel setting. The 5.5 MeV alphas and 91 keV recoiling^{237}Np daughters cannot induce nucleations at temperatures below T_α and T_{αr}, respectively^{3,4,5}. These^{241}Am calibrations allowed us to corroborate the calculation of E_c for each refrigerant (a good knowledge of E_c is crucial to determine the expected SDD sensitivity to WIMP recoils in different operating conditions). An additional test of SDD response to lowenergy nuclear recoils is in preparation at the Sacavem (Lisbon) experimental reactor, using highly monochromatic (filtered) keV neutrons.

4 First Results

The installation 500 m underground of SIMPLE modules started in July 1999. A decommissioned nuclear missile launching control center has been converted into an underground laboratory^{10,11}, facilitating this and other initiatives. The characteristics of this site (microphonic silence, unique electromagnetic shielding of the halls) make it specially adequate for rare-event searches. Modules are placed inside a temperature-regulated water bath, surrounded by three layers of sound and thermal insulation. The 700 l bath, which rests on a dual vibration absorber, doubles as neutron moderator. Events in the modules and in external acoustic monitors are time-tagged, allowing to filter-out the small percentage (¸ 15%) of signals correlated to human activity in the immediate vicinity of the experiment. The signal waveforms are digitally stored, but no event rejection based on pulse-shape considerations is performed at this stage (the sharply-resonant piezoelectric sensors presently employed will eventually be substituted by others with a flatter spectral response, allowing an unequivocal identification of the nucleation sounds). Accounting for

Figure 1. 95% C.L. limits on σW p extracted from 0.19 kg-day of SDD exposure, compared with other experiments (DAMA limits stem from a ¸ 1.5 � 104 kg-day exposure). PICASSO16 has reported similar first limits. The lowest lines indicate the expected sensitivity of SIMPLE-2000 after 25 kg-day, due to the increase in exposure only (dashed line) or at the maximum reachable level at this stage (zero background, solid line off the scale). “MSSM” marks the tip of the region where a lightest supersymmetric partner is expected.

sound detection efficiency and a 62% fluorine mass fraction in R-115 (C_2ClF_5), limits on the spin-dependent WIMP-proton cross section σ_{W p} (Fig. 1) were extracted from the first 0.19 kg-day of exposure of a prototype module^{4,5}. Those limits, while already competitive, were impaired by the large statistical uncertainty associated to the short exposure. A considerable improvement (Fig. 1) is expected with the already implemented expansion of the bath to accommodate multiple modules. SIMPLE 2000 aims at an exposure of ¸ 25 kg-day by replacing the detectors (in batches of seven) every four to six weeks, repeating this cycle several times. A moderated Am/Be neutron source will be used at the end of each run to assess in situ the sound detection efficiency of each module. Runs using refrigerant-free modules showed that a majority of the prototype events arose from pressure microleaks in the old caps, able to stimulate the piezoelectric sensor^{4,5}. Plastic module caps have now been replaced by a sturdier design^b. The expected maximum sensitivity of

bAt the time of this writing, the level of spurious unrejectable acoustic noise in the modules has been reduced by a factor > 20 with respect to the prototype data in 4,5. Pressure microleaks have been eradicated: the remaining source of noise (< 0.1 events/module/day) originates in thermal convection currents in the larger bath able to mechanically disturb microphone cables, changing their capacitance. A first stage of signal amplification next to the piezoelectric transducers and/or improved cabling will avoid this.

SIMPLE 2000 can already start to probe the spin-dependent neutralino parameter space (Fig. 1). As a next step, ten recompressible (i.e., permanent) modules comprising a total active mass of ¸ 250 g are under construction.

5 Prospects

Theoretically predicted spin-dependent (SD) WIMP scattering rates are generally smaller than their spin-independent (SI) counterparts, not profiting from a coherent enhancement in the cross section. Sensitive SD searches should therefore favor the use of fluorine-rich detectors, fluorine being by far the optimal SD target^{12}. To stress the significance of the SD channel, we have recently emphasized^5 a not-so-obvious complementarity of SD and SI searches in exploring the neutralino phase space: the top-left frame in Fig. 2 displays points generated with the help of NEUTDRIVER^{13}, each representing a possible combination of MSSM parameters. The parameter space sampled is the same as in^{14}. Only a weak correlation between the values of σ_{W p} (i.e., the SD coupling strength, corrected for local halo density) and σ_{W n} (idem for SI) is observed in the plot (note the scale). As a result of this, a compact (¸ 1 kg active mass), fluorine-rich, low-background SDD starting to probe the neutralino σ_{W p} (top-right frame) generates a rather homogeneous rejection or

Figure 2. A fluorine-rich SDD of active mass O(1) kg will be sensitive to neutralino WIMPs beyond the reach of the most ambitious planned cryogenic experiments (see text).

“cleaning” of permissible MSSM models in a σ_{W n} exclusion plot (bottom-left frame, without the constrains imposed by the limits in top-right; bottom-right with them), down to values of σ_{W n} far beyond the reach of the most ambitious planned cryogenic WIMP searches. Needless to say, the converse can be stated of the way that sensitive SI searches will deplete the σ_{W p} space and hence the complementarity of both approaches. A second observation that can be made from Fig. 2 is that the SD interaction determines the lower bound for the direct detection rate^{15} (i.e., in most MSSM models σ_{W p} remains large enough for direct detection to be realistic, not necessarily the case for σ_{W n}).

In view of this, if an exhaustive test of the neutralino-as-cold-dark-matter hypothesis is ever to be completed, the development of fluorine-rich detectors cannot be neglected: in this respect CFC-loaded SDDs represent an ideal opportunity. Nevertheless, the development of CBrF_3 and CIF_3 SDDs able to simultaneously explore both SD and SI channels is another of our goals. PICASSO^{16} and SIMPLE intend to merge into an international effort (U. Montreal, U. Paris, U. Lisbon, Yale U., PNNL, SNO, Bose Institute) to fully exploit the promise of this approach to dark matter detection.

References

1. R.E. Apfel, Nucl. Instr. Meth. 162, 603 (1979). 2. F. Seitz, Phys. Fluids 1, 1 (1958). 3. J.I. Collar, Phys. Rev. D 54, R1247 (1996).

4. J.I. Collar, J. Puibasset, T.A. Girard, D. Limagne, H.S. Miley and G.

Waysand, Phys. Rev. Lett. 85, 3083 (2000).

5. J.I. Collar et al., New J. Phys. 2, 14.1 (2000) http://www.njp.org/ 6. M. Harper, Nucl. Sci. Eng. 114, 118 (1993); Nucl. Instr. Meth. A 336, 220 (1993).

7. Y.-Ch. Lo and R. Apfel, Phys. Rev. A 38, 5260 (1988). 8. F. d’Errico, Radiat. Prot. Dosim. 84, 55 (1999). 9. M. El-Nagdy et al., J. Br. Nucl. Eng. Soc. 10, 131 (1971). 10. http://home.cern.ch/collar/RUSTREL/rustrel.html 11. G. Waysand et al., Nucl. Instr. Meth. A 444, 336 (2000). 12. J. Ellis, R.A. Flores, Phys. Lett. B 263, 259 (1991).

13. G. Jungman, M. Kamionkowski, K. Griest: Phys. Rept. 267, 195 (1996). 14. A. Bottino, astro-ph/9611137.

15. V.A. Bednyakov and H.V. Klapdor-Kleingrothaus, hep-ph/0011233. 16. L.A. Hamel et al., Nucl. Instrum. Meth. A388, 91 (1997); Astropart.

Phys. 14, 227 (2000); V. Zacek, these proceedings.