0.25 0.5 0.75 1 1.25 1.5 z

-1.2

-1.1

-0.9

-0.8 w

Fig . 1

0.25 0.5 0.75 1 1.25 1.5 z

-0.95

-0.85

-0.8

-0.75

-0.7

-0.65

-0.6 w

Fig . 2

arXiv:astro-ph/0203225 v1 14 Mar 2002

0.05 0.1 0.15 0.2 0.25 0.3

M

2.1

2.2

2.3

2.4

V