arXiv:astro-ph/0611457 v1 14 Nov 2006

IL NUOVO CIMENTO Vol. ?, N. ? ?

Milagro Search for VHE Emission from GRBs in the Swift Era

P. M. Saz Parkinson(1) for the Milagro Collaboration

(1) Santa Cruz Institue for Particle Physics, U.C.S.C., 1156 High Street, Santa Cruz, CA 95064

Summary. — Since its launch, in late 2004, Swift has been locating gamma-ray bursts (GRBs) at a rate of ∼100 per year. Very high energy (VHE) emission (>100 GeV) is predicted by several models. Here, we present the results of a search for VHE emission from the most recent GRBs to fall within the Milagro field of view.

PACS 98.70.Rz – gamma-ray sources; gamma-ray bursts.

Milagro is a wide field (2 sr), high duty cycle (> 90%), ground-based water Cherenkov gamma-ray telescope which monitors the northern sky almost continuously from 0.1–100 TeV [1]. At these energies, gamma rays are attenuated by the redshift-dependent extragalactic background light (EBL) [2], making GRBs above z>0.5 very hard to detect. Milagro has been operating (and searching for VHE emission from GRBs) since 2000 [3].

The launch of Swift has increased greatly the number of well-localized GRBs. Here we present the results of a search for an excess of events above those due to the background for 39 GRBs detected by several satellites (primarily Swift) between December 2004 and May 2006. Table I lists the GRBs in the sample and summarizes the results. The number of events falling within a 1.6 degree bin is summed for the relevant duration (column 2 of Table I) and the number of background events is estimated from two hours of data surrounding the burst, using a technique known as “direct integration” [4]. No significant emission was detected from any of the locations. We present upper limits on the fluence in column 7 of Table I. For those bursts with known redshift, we compute the effect of EBL absorption, according to the model of ref. [2] and print the upper limits in bold. ∗ ∗ ∗ We have used GCN Notices to select raw data for archiving and use in this search, and we are grateful for the hard work of the GCN team, especially Scott Barthelmy. We acknowledge Scott Delay and Michael Schneider for their dedicated efforts in the construction and maintenance of the Milagro experiment.This work has been supported by the National Science Foundation, the US Department of Energy (Office of High-Energy Physics and Office of Nuclear Physics), Los Alamos National Laboratory, the University of California, and the Institute of Geophysics and Planetary Physics. I appreciate the support of the American Astronomical Society and the National Science Foundation in

© Società Italiana di Fisica 1

2 P. M. SAZ PARKINSON FOR THE MILAGRO COLLABORATION

GRB T90/Dur. Zenith angle, θ z Instrument σ 99% UL(fluence)

041219a 520 26.9 ... INTEGRAL +1.7 5.8e-6 050124 4 23.0 ... Swift -0.8 3.0e-7 050319 15 45.1 3.24 Swift +0.6 ... 050402 8 40.4 ... Swift +0.6 2.1e-6 050412 26 37.2 ... Swift -0.6 1.7e-6 050502 20 42.7 3.793 INTEGRAL +0.6 ... 050504 80 27.6 ... INTEGRAL -0.8 1.3e-6 050505 60 28.9 4.3 Swift +1.2 ... 050509b 0.128 10.0 0.226 Swift -0.9 1.1e-6 050522 15 22.9 ... INTEGRAL -0.6 5.1e-7 050607 26.5 29.3 ... Swift -0.9 8.9e-7 050712 35 38.8 ... Swift -0.1 2.5e-6 050713b 30 44.2 ... Swift -0.3 4.0e-6 050715 52 36.9 ... Swift -1.5 1.7e-6 050716 69 30.3 ... Swift -0.5 1.6e-6 050820 20 21.9 2.612 Swift +0.2 ... 051103 0.17 49.9 0.001 IPN -0.2 4.2e-6 051109 36 9.7 2.346 Swift -1.1 4.3e-3 051111 20 43.7 1.55 Swift +0.7 3.8e-2 051211b 80 33.3 ... INTEGRAL +0.4 2.6e-6 051221 1.4 41.8 0.55 Swift +0.6 9.8e-4 051221b 61 25.9 ... Swift +1.5 1.8e-6 060102 20 39.9 ... Swift -0.9 2.0e-6 060109 10 22.4 ... Swift -1.3 4.1e-7 060110 15 43.0 ... Swift -0.3 3.0e-6 060111b 59 36.5 ... Swift -0.6 2.3e-6 060114 100 40.6 ... INTEGRAL +0.5 5.1e-6 060204b 134 30.5 ... Swift +0.3 2.7e-6 060210 5 43.4 3.91 Swift +0.6 2.9e-6 060218^∗ 10 44.6 0.03 Swift +2.4 3.8e-5 060306 30 46.2 ... Swift +1.0 7.2e-6 060312 30 43.6 ... Swift -1.0 3.3e-6 060313 0.7 46.7 ... Swift -0.5 2.7e-6 060403 25 27.6 ... Swift -0.1 1.0e-6 060427b 0.2 16.4 ... IPN +0.6 1.7e-7 060428b 58 26.6 ... Swift -1.1 1.1e-6 060507 185 47.1 ... Swift +0.4 1.6e-5 060510b 300 42.8 4.9 Swift +1.9 ... 060515 52 41.5 ... Swift -0.3 9.6e-6

Table I. – List of GRB in the field of view of Milagro in the Swift Era (December 2004 – May 2006), with preliminary 99% confidence upper limits on the fluence (0.2–20 TeV), in ergs cm^{−2}. ∗This burst, due to its long duration of more than 2000 s left Milagro’s field of view while in progress. The limit presented here is for the 10 s hard spike reported by the instrument team.

the form of an International Travel Grant, which enabled me to attend this conference. I am also grateful to the conference organizers for their financial support.

MILAGRO SEARCH FOR VHE EMISSION FROM GRBS IN THE SWIFT ERA 3

REFERENCES [1] Atkins, R. et al., Nucl. Instrum. Meth. A, 449 (478) 2000 [2] Primack, J. R. et al. 2005, Gamma 2004, AIP Conference Proceedings, 745 (23-33) [3] Atkins, R., et al., ApJ, 630 (996) 2005 [4] Atkins, R. et al., ApJ, 595 (803) 2003