0

0.05

0 0.2 0.4 0.6 0.8 1

Q^2 = 8 GeV^2

ξF_2^{D(3)}(ξ=0.0042)

0

0.05

0 0.2 0.4 0.6 0.8 1

Q^2 = 14 GeV^2

0

0.05

0 0.2 0.4 0.6 0.8 1

Q^2 = 27 GeV^2

0

0.05

0 0.2 0.4 0.6 0.8 1

Q^2 = 60 GeV^2

β