0 2 4 6 8 10 12

10^{-2} 10^{-1} x x G(x)

H1 preliminary

NLO QCD fit μ^2_f = 200 GeV^2

H1 dijets

CTEQ5M MRST GRV98

H1 F_2 fit

(Jerusalem ’97)

ZEUS F_2 fit

central values