10^{-4} 10^{-3} 10^{-2} 10^{-1} 0.0 0.5 1.0 1.5 0.0 0.5 1.0 1.5 0.0 0.5 1.0 1.5 H1 (96) F_2 (GRV 95) F_2 (MOD)

10^{-4} 10^{-3} 10^{-2} 10^{-1}

F_2

x

Q^2=1.5 GeV^2

Q^2=2.0 GeV^2

Q^2=2.5 GeV^2

Q^2=3.5 GeV^2

Q^2=5.0 GeV^2

Q^2=6.5 GeV^2