dn d^3p [GeV^{−3}]

dn d^3p [GeV^{−3}]

√ s[GeV]

⋄ e+e^− △ DIS � DIS (avg)

× K^± in e+e^− ∗ p(p̄) in e+e^− a) p = 0.2 GeV

p = 0.7 GeV

p = 1.2 GeV

b) p = 0.3 GeV

p = 0.6 GeV