0 0.5 1 1.5 2 2.5 3 3.5 4

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

ZEUS Preliminary 1995 Energy Scale Uncertainty Herwig with GRV LO Herwig with SaS1D Lepto

Q^2 (GeV^2) σ(x_γ Λ 0.75)/σ(x_γ Γ 0.75)