ZEUS

0 0.2 0.4 0.6

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

ZEUS 1996 - 2000 NLO QCD ⊗ HAD NLO QCD CASCADE

x_γ^{obs} Λ 0.75

dσ/dcosΘ^*

0

0.5

1

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

Jet energy scale uncertainty

x_γ^{obs} Γ 0.75

cosθ^*

7 γ direction p direction 5