ZEUS

10^{-3}

10^{-2}

10^{-1} 1 10

5 10 15 20 p_T(D^*) (GeV) dσ/dp_T (nb/GeV)

ZEUS (prel.) 98-00 a) NLL QCD AFG for γ GRV for γ only direct γ

0 5 10 15 20 25

-1 0 1 η(D^*) dσ/dη (nb) b) NLO QCD

0 0.1 0.2 0.3 0.4 0.5 0.6

150 200 250 W (GeV) dσ/dW (nb/GeV) c)

10

10^2

0 0.2 0.4 0.6 0.8 1 z(D^*) dσ/dz (nb) d)