Chapter 2

Detector for the Linear Collider

General Detector Concepts and Detector Performance Conveners: M. Martinez, D.J. Miller, M. Piccolo Working Group: A. Andreazza, M. Battaglia, G. Blair, G. Daskalakis, A. Juste, A. Kyriakis, C. Markou, H.U. Martyn, H. Nowak, I. Riu, M. Sachwitz, H.J. Schreiber, D. Schulte, R. Settles, R. Shanidze, C. Shepherd-Themistocleous, S. Shichanin, E. Simopoulou, R. Vuopionperä, C. Troncon Detector Subsystems Conveners: M. Mazzucato, D. Saxon, R. Settles Working Group: S. Aïd, A. Andreazza, P. Bambade, T. Barklow, W. Bartel, M. Battaglia, R. Bellanzzini, S. Bertolucci, G. Blair, R. Brinkmann, I. Brock, R. Brown, J. Bürger, P.J. Bussey, M. Caccia, P. Checchia, G. Coignet, P. Colas, P. Clarke, C. Damerell, M. David, A. De Roeck, E. Elsen, E. Fernandez, Y. Giomataris, T. Greenshaw, R. Heuer, C. Heusch, N. Holtkamp, P. Hüntemeyer, P. Janot, L. Jönsson, F.P. Juster, B.J. King, F. Kircher, V. Korbel, U. Kötz, Y. Kurihara, P. Le Du, M. Leenen, W. Lohmann, C. Luci, L. Mandelli, M. Martinez, C. Meroni, J. Meyer, D. Miller, R. Nahnhauer, O. Napoly, R. Nania, R. Orava, M. Piccolo, M. Pohl, D. Reed, F. Richard, A. Rousarie, H.-G. Sander, U. Schneekloth, H.J. Schreiber, S. Schreiber, D. Schulte, C. Shepherd-Themistocleous, F. Simonetto, K. Sinram, A. Skillman, A. Sopczak, P. Steffen, H. Steiner, J. Steuerer, G. Tonelli, M. Tonutti, C. Troncon, C. VanderVelde, G. Vegni, A. Wagner, N. Walker, M. Weber, W. Wiedenmann, G.W. Wilson, K. Zapfe-Düren Collider-Experiment Interface Conveners: N. Holtkamp, M. Leenen, O. Napoly Working Group: G. Bardin, R. Brinkmann, C. Cavata, S. Drozhdin, J.-P. Jorda, N. Mokhov, M. Sachwitz, H.J. Schreiber, S. Schreiber, D. Schulte, R. Settles, K. Sinram, N. Walker, K. Zapfe-Düren

112 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER

Contents

2 Detector for the Linear Collider 111 2.1 General Detector Concept . . . . . . . . . . . . . . . . . . . . . . . . . 115 2.1.1 Introduction . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 115 2.1.2 Layout Concept . . . . . . . . . . . . . . . . . . . . . . . . . . . 117 2.1.3 Layout for Other Machine Options . . . . . . . . . . . . . . . . 122 2.1.4 The Detector Magnet . . . . . . . . . . . . . . . . . . . . . . . . 123 2.1.5 Rates . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 126 2.2 Subdetectors . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 135 2.2.1 Silicon Vertex Detector and Forward Tracker . . . . . . . . . . . 135 2.2.2 Intermediate Tracker . . . . . . . . . . . . . . . . . . . . . . . . 143 2.2.3 Main Tracker . . . . . . . . . . . . . . . . . . . . . . . . . . . . 145 2.2.4 Combined Tracking Performance . . . . . . . . . . . . . . . . . 152 2.2.5 Calorimetry . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 155 2.2.6 Instrumented Iron . . . . . . . . . . . . . . . . . . . . . . . . . . 173 2.2.7 Luminosity Calorimeter . . . . . . . . . . . . . . . . . . . . . . 177 2.2.8 Infrastructure . . . . . . . . . . . . . . . . . . . . . . . . . . . . 179 2.3 Detector Performance . . . . . . . . . . . . . . . . . . . . . . . . . . . . 191 2.3.1 Precision Measurement of Luminosity and ps . . . . . . . . . . 192 2.3.2 Top Physics . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 194 2.3.3 Higgs Physics . . . . . . . . . . . . . . . . . . . . . . . . . . . . 199 2.3.4 Production of the HA Final State . . . . . . . . . . . . . . . . . 205 2.3.5 e+e� ! WW . . . . . . . . . . . . . . . . . . . . . . . . . . . 210 2.3.6 Study of e^+e� ! χ^+_1 χ�_1 . . . . . . . . . . . . . . . . . . . . . . 216 2.3.7 Study of e^+e� ! μ̃R μ̃R . . . . . . . . . . . . . . . . . . . . . . . 222 2.3.8 Conclusions . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 229 2.4 Interface between Collider and Experiment . . . . . . . . . . . . . . . . 235 2.4.1 Beam Delivery System . . . . . . . . . . . . . . . . . . . . . . . 235 2.4.2 Interaction Region Layout . . . . . . . . . . . . . . . . . . . . . 236 2.4.3 Accelerator Backgrounds . . . . . . . . . . . . . . . . . . . . . . 237 2.4.4 Beam-Beam related Backgrounds and Masking . . . . . . . . . 244

114 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER

2.4.5 Ground Motion Detection and Feedback . . . . . . . . . . . . . 252 2.4.6 Beam Related Measurements . . . . . . . . . . . . . . . . . . . 253 2.4.7 Luminosity expectation for a calibration run on the Z^0-pole . . . 264 2.5 Conclusion on Particle Physics and Experiments . . . . . . . . . . . . . 271

130 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER

134 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER

184 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER

234 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER

270 CHAPTER 2. DETECTOR FOR THE LINEAR COLLIDER