DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–013 arXiv:1101.2652 February 2011

Observational Consequences of Chaotic Inflation with Nonminimal Coupling to Gravity

A. Linde, M. Noorbala

Stanford Institute for Theoretical Physics and Department of Physics, Stanford University, Stanford, USA

A. Westphal

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG