DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–042 IPPP/11/13 DCTP/11/26 arXiv:1103.3705 March 2011

Testing String Vacua in the Lab: From a Hidden CMB to Dark Forces in Flux Compactifications

M. Cicoli, M. Goodsell, A. Ringwald

Deutsches Elektronen-Synchrotron DESY, Hamburg

J. Jaeckel

Institute for Particle Physics Phenomenology, University of Durham, UK

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG