DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–107 CERN-OPEN-2011-033 arXiv:1107.0975 July 2011

Updated Status of the Global Electroweak Fit and Constraints on New Physics

The Gfitter Group

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG