DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–124 CERN-PH-TH/2011-228 arXiv:1109.5295 October 2011

Monte Carlo Tuning in the Presence of Matching

B. Cooper

Department of Physics and Astronomy, University College London, UK

J. Katzy, L. Mijović

Deutsches Elektronen-Synchrotron DESY, Hamburg

M. L. Mangano, A. Messina, P. Skands

CERN, Geneva, Switzerland

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG