DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–132 CERN-PH-TH/2011-185 LPT-ORSAY 11-666 arXiv:1108.1183 September 2011

If No Higgs Then What?

A. Falkowski

Laboratoire de Physique Théorique d’Orsay, UMR8627-CNRS, Université de Paris-Sud, Orsay, France

C. Grojean

CERN, Geneva, Switzerland and Institut de Physique Théorique, CEA/Saclay, Gif-sur-Yvette, France

A. Kamińska

Institute of Theoretical Physics, Faculty of Physics, Warsaw University, Poland

S. Pokorski

CERN, Geneva, Switzerland and Institute of Theoretical Physics, Faculty of Physics, Warsaw University, Poland

A. Weiler

CERN, Geneva, Switzerland and Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG