DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–138 August 2011

Potential of the FLASH FEL Technology for the Construction of a kW-Scale Light Source for the Next Generation Lithography

E. A. Schneidmiller, V. F. Vogel, H. Weise, M. V. Yurkov

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG