DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–172 arXiv:1110.0783 October 2011

Violations of Lorentz Invariance in the Neutrino Sector after OPERA

L. Maccione

Deutsches Elektronen-Synchrotron DESY, Hamburg

S. Liberati

SISSA, Trieste, Italy and INFN, Sezione di Trieste, Italy

D. M. Mattingly

Department of Physics, University of New Hampshire, Durham, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG