DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–187 LMU-ASC 51/11 TUM-HEP 818/11 LPSC-11220 arXiv:1110.5229 October 2011

The Orbifolder:

A Tool to Study the Low Energy Effective Theory of Heterotic Orbifolds

H. P. Nilles

Bethe Center for Theoretical Physics and Physikalisches Institut der Universität Bonn

S. Ramos-Sánchez

Department of Theoretical Physics, Physics Institute, UNAM, Mexico

P.K.S. Vaudrevange

Deutsches Elektronen-Synchrotron DESY, Hamburg and Physik-Department T30, Technische Universität München, Garching and Arnold-Sommerfeld-Center for Theoretical Physics, München

A. Wingerter

Laboratoire de Physique Subatomique et de Cosmologie, UJF Grenoble 1, CNRS/IN2P3, INPG, Grenoble, France

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG