DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–232 ZU-TH 25/11 LPN11-71 MCNET-11-26 November 2011

Determining the Helicity Structure of Third Generation Resonances

A. Papaefstathiou

Institut für Theoretische Physik, Universität Zürich, Switzerland

K. Sakurai

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG