DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 11–261 ULB-TH/12-08 arXiv:1206.6316 June 2012

Status of the Inert Doublet Model and the Role of Multileptons at the LHC

M. Gustafsson

Service de Physique Théorique, Université Libre de Bruxelles, Belgium

S. Rydbeck

Deutsches Elektronen-Synchrotron DESY, Hamburg

L. Lopez-Honorez

Max-Planck-Institut für Kernphysik, Heidelberg

E. Lundström

The Oskar Klein Centre, AlbaNova University, Stockholm, Sweden

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG