DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–004 arXiv:1201.2636 January 2012

Asymmetric Dark Matter from Spontaneous Cogenesis in the Supersymmetric Standard Model

K. Kamada

Deutsches Elektronen-Synchrotron DESY, Hamburg

M. Yamaguchi

Department of Physics, Tokyo Institute of Technology, Tokyo, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG