DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–009 arXiv:1201.4338 January 2012

The Fermi Scale as a Focus Point of High-Scale Gauge Mediation

F. Brümmer, W. Buchmüller

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG