DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–014 arXiv:1202.1500 February 2012

Physics on Smallest Scales – An Introduction to Minimal Length Phenomenology

M. Sprenger

Institute for Theoretical Physics, Goethe University and Frankfurt Institute for Advanced Studies, Frankfurt am Main and Deutsches Elektronen-Synchrotron DESY, Hamburg

P. Nicolini, M. Bleicher

Institute for Theoretical Physics, Goethe University and Frankfurt Institute for Advanced Studies, Frankfurt am Main

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG