DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–020 PITT PACC 12002 FR-PHENO-10-030 IPHC-PHENO-10-03 IPPP/10/80 DCPT/10/160 MADPH-10-1562 EDINBURGH-2010-25 arXiv:1010.3251 April 2012

Introducing an Interface between FeynRules and WHIZARD

N. D. Christensen

PITTsburgh Particle Physics, Astrophysics and Cosmology Center, Department of Physics and Astronomy, University of Pittsburgh, USA

C. Duhr

Institute for Particle Physics Phenomenology, University of Durham, UK

B. Fuks

Institut Pluridisciplinaire Hubert Curien/Départment Recherches Subatomiques, Université de Strasbourg/CNRS-IN2P3, Strasbourg, France

J. Reuter

Deutsches Elektronen-Synchrotron DESY, Hamburg and Physikalisches Institut, Albert-Ludwigs-Universität Freiburg and School of Physics and Astronomy, University of Edinburgh, UK

C. Speckner

Physikalisches Institut, Albert-Ludwigs-Universität Freiburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG