DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–029 LTH 938 LPN12-037 SFB/CPP-12-12 arXiv:1202.5224 February 2012

Generalized Threshold Resummation for Semi-Inclusive e^+e^− Annihilation

N. A. Lo Presti, A. Vogt

Department of Mathematical Sciences, University of Liverpool, UK

A. A. Almasy

Deutsches Elektronen-Synchrotron DESY, Zeuthen

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN