DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–043 RESCEU-4/12 arXiv:1203.4059 March 2012

Generalized Higgs Inflation

K. Kamada

Deutsches Elektronen-Synchrotron DESY, Hamburg

T. Kobayashi

Hakubi Center, Kyoto University, Kyoto, Japan and Department of Physics, Kyoto University, Kyoto, Japan

T. Takahashi

Department of Physics, Saga University, Saga, Japan

M. Yamaguchi

Department of Physics, Tokyo Institute of Technology, Japan

J. Yokoyama

Research Center for the Early Universe (RESCEU), Graduate School of Science, The University of Tokyo, Japan and Institute for the Physics and Mathematics of the Universe (IPMU), The University of Tokyo, Kashiwa, Chiba, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG