DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–058 CERN-PH-TH/2012-153 arXiv:1206.0819 June 2012

The Type IIB String Axiverse and Its Low-Energy Phenomenology

M. Cicoli

Abdus Salam ICTP, Trieste, Italy and INFN, Sezione di Trieste, Italy

M. D. Goodsell

CERN, Geneva, Switzerland

A. Ringwald

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG