DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–072 arXiv:1206.4346 May 2012

Measurement of Beauty Photoproduction near Threshold Using Di-Electron Events with the H1 Detector at HERA

H1 Collaboration

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG