DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–076 IPPP/12/33 MCnet-12-05 CERN-PH-TH-2012-142 DCPT/12/66 KA-TP-20-2012 ZU-TH 06/12 arXiv:1205.4902 May 2012

Herwig++ 2.6 Release Note

K. Arnold, S. Gieseke, C. Röhr, M. Stoll

Institut für Theoretische Physik, Karlsruher Institut für Technologie

L. d’Errico

Institut für Theoretische Physik, Karlsruher Institut für Technologie and Institute for Particle Physics Phenomenology, University of Durham, UK

D. Grellscheid, P. Richardson, D. Winn

Institute for Particle Physics Phenomenology, University of Durham, UK

K. Hamilton

CERN, Geneva, Switzerland

A. Papaefstathiou

Institut für Theoretische Physik, Universität Zürich, Switzerland

S. Plätzer

Deutsches Elektronen-Synchrotron DESY, Hamburg

A. Schofield, A. Siódmok

School of Physics and Astronomy, University of Manchester, UK

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG