DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–104 arXiv:1206.4312 June 2012

Resummation Properties of Jet Vetoes at the LHC

F. J. Tackmann

Deutsches Elektronen-Synchrotron DESY, Hamburg

J. R. Walsh, S. Zuberi

Ernest Orlando Lawrence Berkeley National Laboratory, University of California, Berkeley, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG