DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–113 CERN-PH-TH/2012-186 LPT-Orsay 12/64 LPN 12-073 SFB/CPP-12-41 arXiv:1207.0980 July 2012

The Top Quark and Higgs Boson Masses and the Stability of the Electroweak Vacuum

S. Alekhin

Institute for High Energy Physics, Protvino, Moscow Region, Russia

A. Djouadi

Laboratoire de Physique Théorique, CNRS and Université de Paris-Sud, Orsay, France and CERN, Geneva, Switzerland

S. Moch

Deutsches Elektronen-Synchrotron DESY, Zeuthen

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN