DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–130 ZMP-HH/12-15 arXiv:1208.0704 August 2012

Voisin-Borcea Manifolds and Heterotic Orbifold Models

W. Buchmuller, J. Schmidt

Deutsches Elektronen-Synchrotron DESY, Hamburg

J. Louis

II. Institut für Theoretische Physik, Universität Hamburg and Zentrum für Mathematische Physik, Universität Hamburg

R. Valandro

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG