DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–154 arXiv:1209.2716 September 2012

The Electroweak Fit of the Standard Model after the Discovery of a New Boson at the LHC

The Gfitter Group

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG