DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–224 arXiv:1212.0569 December 2012

Screening in Two-Dimensional Gauge Theories

P. Korcyl

M. Smoluchowski Institute of Physics, Jagiellonian University, Cracow, Poland and John von Neumann-Institut für Computing NIC/DESY, Zeuthen

M. Koren

M. Smoluchowski Institute of Physics, Jagiellonian University, Cracow, Poland

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN