DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–240 arXiv:1212.3168 December 2012

On Chromoelectronic (Super)Conductivity of the Yang-Mills Vacuum

M. N. Chernodub

CNRS, Laboratoire de Mathématiques et Physique Théorique, Université François-Rabelais Tours, Tours, France and Department of Physics and Astronomy, University of Gent, Belgium

J. Van Doorsselaere, H. Verschelde

Department of Physics and Astronomy, University of Gent, Belgium

T. Kalaydzhyan

Deutsches Elektronen-Synchrotron DESY, Hamburg and ITEP, Moscow, Russia

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG