DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–244 HU-EP-12/54 arXiv:1212.4319 December 2012

On the Difference between the Pole and the MS Masses of the Top Quark at the Electroweak Scale

F. Jegerlehner

Institut für Physik, Humboldt-Universität, Berlin and Deutsches Elektronen-Synchrotron DESY, Zeuthen

M. Yu. Kalmykov, B. A. Kniehl

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG