DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–245 arXiv:1212.4135 December 2012

Relations between Canonical and Non-Canonical Inflation

R. Gwyn

AEI Max-Planck-Institut für Gravitationsphysik, Potsdam

M. Rummel

II. Institut für Theoretische Physik, Universität Hamburg

A. Westphal

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG