DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 12–246 arXiv:1212.4530 December 2012

Finding all Flux Vacua in an Explicit Example

D. Martínez-Pedrera, M. Rummel

II. Institut für Theoretische Physik, Universität Hamburg

D. Mehta

Department of Physics, Syracuse University, Syracuse, New York, USA

A. Westphal

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG