DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–022 HU-EP-13/05 SFB/CPP-13-13 arXiv:1302.6419 February 2013

Quasi-Monte Carlo Methods for Lattice Systems: A First Look

K. Jansen

John von Neumann-Institut für Computing NIC/DESY, Zeuthen and Department of Physics, University of Cyprus, Nicosia, Cyprus

H. Leovey

Institut für Mathematik, Humboldt-Universität, Berlin

A. Nube

John von Neumann-Institut für Computing NIC/DESY, Zeuthen and Institut für Physik, Humboldt-Universität, Berlin

A. Griewank

Institut für Mathematik, Humboldt-Universität, Berlin

M. Müller-Preussker

Institut für Physik, Humboldt-Universität, Berlin

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN