DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–024 ANL-HEP-PR-13-12 EFI-13-2 FERMILAB-PUB-13-041-T arXiv:1302.7033 February 2013

MSSM Higgs Boson Searches at the LHC: Benchmark Scenarios after the Discovery of a Higgs-Like Particle

M. Carena

Theoretical Physics Department, Fermilab, Batavia, USA and Enrico Fermi Institute and Kavli Institute for Cosmological Physics, Department of Physics, University of Chicago, USA

S. Heinemeyer

Instituto de Física de Cantabria (CSIC-UC), Santander, Spain

O. Stål

The Oscar Klein Centre, Department of Physics, Stockholm University, Sweden

C.E.M. Wagner

Enrico Fermi Institute and Kavli Institute for Cosmological Physics, Department of Physics, University of Chicago, USA and HEP Division, Argonne National Laboratory, Argonne, USA

G. Weiglein

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG