DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–057 UWTHPH-2013-6 arXiv:1303.6524 March 2013

NLO NRQCD Disfavors the Interpretation of X(3872) as χ_{cl}(2P )

M. Butenschoen

Fakultät für Physik, Universität Wien, Austria

Z.-G. He, B. A. Kniehl

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG