DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–076 arXiv:1305.1947 May 2013

Evading the Lyth Bound in Hybrid Natural Inflation

A. Hebecker, S. C. Kraus

Institut für Theoretische Physik, Universität Heidelberg

A. Westphal

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG