DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–087 NSF-KITP-13-085 arXiv:1306.1237 June 2013

Extended No-Scale Structure and α^{′2} Corrections to the Type IIB Action

F. G. Pedro

Deutsches Elektronen-Synchrotron DESY, Hamburg

M. Rummel

II. Institut für Theoretische Physik, Universität Hamburg and Institute for Advanced Study, Hong Kong University of Science and Technology, Hong Kong

A. Westphal

Deutsches Elektronen-Synchrotron DESY, Hamburg and Kavli Institute for Theoretical Physics, Santa Barbara, California, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG